\hypertarget{struct__OutputMessage}{
\section{\_\-OutputMessage Struct Reference}
\label{struct__OutputMessage}\index{\_\-OutputMessage@{\_\-OutputMessage}}
}
This is a buffer with a header large enough to hold the control information to both store this on the FPA free que and post it to an output FORK que. The body of the message is the buffer for the output datagram.  


\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\begin{tabbing}
xx\=xx\=xx\=xx\=xx\=xx\=xx\=xx\=xx\=\kill
union \{\\
\>FPA\_pcb \hyperlink{struct__OutputMessage_f1c1162b202d1390693d2ead02188d15}{fpa}\\
\>FORK\_msg\_hdr \hyperlink{struct__OutputMessage_c2ab50f36d6295f45749d4353d8b0abb}{fork}\\
\} \hyperlink{struct__OutputMessage_8e286a9def9ac19931cedd902f341d88}{hdr}\\

\end{tabbing}\item 
int \hyperlink{struct__OutputMessage_13b3ba1b7d5ac5e3f0c1ccb620669bc3}{bridge}
\item 
\hyperlink{struct__ASC__ascBdy__Raw0}{ASC\_\-ascBdy\_\-Raw0} \hyperlink{struct__OutputMessage_4bd1ea781afbcf085972b0af5bd34d9b}{pkt}
\end{CompactItemize}


\subsection{Detailed Description}
This is a buffer with a header large enough to hold the control information to both store this on the FPA free que and post it to an output FORK que. The body of the message is the buffer for the output datagram. 

\subsection{Member Data Documentation}
\hypertarget{struct__OutputMessage_13b3ba1b7d5ac5e3f0c1ccb620669bc3}{
\index{\_\-OutputMessage@{\_\-OutputMessage}!bridge@{bridge}}
\index{bridge@{bridge}!_OutputMessage@{\_\-OutputMessage}}
\subsubsection[{bridge}]{\setlength{\rightskip}{0pt plus 5cm}int {\bf \_\-OutputMessage::bridge}}}
\label{struct__OutputMessage_13b3ba1b7d5ac5e3f0c1ccb620669bc3}


The bridge word 

Referenced by AscEdsFlush(), and output().\hypertarget{struct__OutputMessage_c2ab50f36d6295f45749d4353d8b0abb}{
\index{\_\-OutputMessage@{\_\-OutputMessage}!fork@{fork}}
\index{fork@{fork}!_OutputMessage@{\_\-OutputMessage}}
\subsubsection[{fork}]{\setlength{\rightskip}{0pt plus 5cm}FORK\_\-msg\_\-hdr {\bf \_\-OutputMessage::fork}}}
\label{struct__OutputMessage_c2ab50f36d6295f45749d4353d8b0abb}


used by FORK routines (when forking to output 

Referenced by AscEdsFlush().\hypertarget{struct__OutputMessage_f1c1162b202d1390693d2ead02188d15}{
\index{\_\-OutputMessage@{\_\-OutputMessage}!fpa@{fpa}}
\index{fpa@{fpa}!_OutputMessage@{\_\-OutputMessage}}
\subsubsection[{fpa}]{\setlength{\rightskip}{0pt plus 5cm}FPA\_\-pcb {\bf \_\-OutputMessage::fpa}}}
\label{struct__OutputMessage_f1c1162b202d1390693d2ead02188d15}


Used by FPA routines (when on FreeList) \hypertarget{struct__OutputMessage_8e286a9def9ac19931cedd902f341d88}{
\index{\_\-OutputMessage@{\_\-OutputMessage}!hdr@{hdr}}
\index{hdr@{hdr}!_OutputMessage@{\_\-OutputMessage}}
\subsubsection[{hdr}]{\setlength{\rightskip}{0pt plus 5cm}union \{ ... \}                     {\bf \_\-OutputMessage::hdr}}}
\label{struct__OutputMessage_8e286a9def9ac19931cedd902f341d88}


The header link area 

Referenced by AscEdsFlush().\hypertarget{struct__OutputMessage_4bd1ea781afbcf085972b0af5bd34d9b}{
\index{\_\-OutputMessage@{\_\-OutputMessage}!pkt@{pkt}}
\index{pkt@{pkt}!_OutputMessage@{\_\-OutputMessage}}
\subsubsection[{pkt}]{\setlength{\rightskip}{0pt plus 5cm}{\bf ASC\_\-ascBdy\_\-Raw0} {\bf \_\-OutputMessage::pkt}}}
\label{struct__OutputMessage_4bd1ea781afbcf085972b0af5bd34d9b}


The data used to fill the datagram 

Referenced by AscEdsFlush(), AscEdsProcess(), get\_\-packet(), initMsg(), and output().

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{ASC__eds_8c}{ASC\_\-eds.c}\end{CompactItemize}
