\hypertarget{struct__Flush}{
\section{\_\-Flush Struct Reference}
\label{struct__Flush}\index{\_\-Flush@{\_\-Flush}}
}
Flush control structure.  


\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hyperlink{ASC__eds_8c_55a882ed14dcfbf344e7d9b833e77d01}{FlushDeliverRtn} \hyperlink{struct__Flush_9a3bb5bd59a7891f179034100e126f4a}{rtn}
\item 
void $\ast$ \hyperlink{struct__Flush_0b6f7f3f23c157d3a2baa32110dfaafb}{ctx}
\item 
\hyperlink{struct__FlushMessage}{FlushMessage} \hyperlink{struct__Flush_d015dd9dfeca8536ae62b224e3e88ccb}{msg}
\item 
int \hyperlink{struct__Flush_d935b36889f94924e5eab2fbb6a25a81}{cnt}
\item 
unsigned long long int \hyperlink{struct__Flush_f8d337dff5ec26d80a58519ffae53f6b}{nsecx}
\item 
WUT\_\-tmr \hyperlink{struct__Flush_8dd695686d4511f99500f25d527cc79f}{tmr}
\end{CompactItemize}


\subsection{Detailed Description}
Flush control structure. 

\subsection{Member Data Documentation}
\hypertarget{struct__Flush_d935b36889f94924e5eab2fbb6a25a81}{
\index{\_\-Flush@{\_\-Flush}!cnt@{cnt}}
\index{cnt@{cnt}!_Flush@{\_\-Flush}}
\subsubsection[{cnt}]{\setlength{\rightskip}{0pt plus 5cm}int {\bf \_\-Flush::cnt}}}
\label{struct__Flush_d935b36889f94924e5eab2fbb6a25a81}


Flush on every N histogrammed 

Referenced by AscEdsConstruct(), and AscEdsProcess().\hypertarget{struct__Flush_0b6f7f3f23c157d3a2baa32110dfaafb}{
\index{\_\-Flush@{\_\-Flush}!ctx@{ctx}}
\index{ctx@{ctx}!_Flush@{\_\-Flush}}
\subsubsection[{ctx}]{\setlength{\rightskip}{0pt plus 5cm}void$\ast$ {\bf \_\-Flush::ctx}}}
\label{struct__Flush_0b6f7f3f23c157d3a2baa32110dfaafb}


Context parameter for delivery routine 

Referenced by AscEdsConstruct(), and flush\_\-tmr().\hypertarget{struct__Flush_d015dd9dfeca8536ae62b224e3e88ccb}{
\index{\_\-Flush@{\_\-Flush}!msg@{msg}}
\index{msg@{msg}!_Flush@{\_\-Flush}}
\subsubsection[{msg}]{\setlength{\rightskip}{0pt plus 5cm}{\bf FlushMessage} {\bf \_\-Flush::msg}}}
\label{struct__Flush_d015dd9dfeca8536ae62b224e3e88ccb}


Flush Message 

Referenced by AscEdsConstruct(), and flush\_\-tmr().\hypertarget{struct__Flush_f8d337dff5ec26d80a58519ffae53f6b}{
\index{\_\-Flush@{\_\-Flush}!nsecx@{nsecx}}
\index{nsecx@{nsecx}!_Flush@{\_\-Flush}}
\subsubsection[{nsecx}]{\setlength{\rightskip}{0pt plus 5cm}unsigned long long int {\bf \_\-Flush::nsecx}}}
\label{struct__Flush_f8d337dff5ec26d80a58519ffae53f6b}


Flush every N nseconds 

Referenced by AscEdsConstruct(), AscEdsProcess(), and flush\_\-forward().\hypertarget{struct__Flush_9a3bb5bd59a7891f179034100e126f4a}{
\index{\_\-Flush@{\_\-Flush}!rtn@{rtn}}
\index{rtn@{rtn}!_Flush@{\_\-Flush}}
\subsubsection[{rtn}]{\setlength{\rightskip}{0pt plus 5cm}{\bf FlushDeliverRtn} {\bf \_\-Flush::rtn}}}
\label{struct__Flush_9a3bb5bd59a7891f179034100e126f4a}


Delivery routine 

Referenced by AscEdsConstruct(), and flush\_\-tmr().\hypertarget{struct__Flush_8dd695686d4511f99500f25d527cc79f}{
\index{\_\-Flush@{\_\-Flush}!tmr@{tmr}}
\index{tmr@{tmr}!_Flush@{\_\-Flush}}
\subsubsection[{tmr}]{\setlength{\rightskip}{0pt plus 5cm}WUT\_\-tmr {\bf \_\-Flush::tmr}}}
\label{struct__Flush_8dd695686d4511f99500f25d527cc79f}


Flush timer 

Referenced by AscEdsConstruct(), AscEdsDestruct(), AscEdsProcess(), and flush\_\-forward().

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{ASC__eds_8c}{ASC\_\-eds.c}\end{CompactItemize}
