\hypertarget{struct__FlushMessage}{
\section{\_\-Flush\-Message Struct Reference}
\label{struct__FlushMessage}\index{_FlushMessage@{\_\-FlushMessage}}
}
Flush fork message structure.  


Collaboration diagram for \_\-Flush\-Message:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=256pt]{struct__FlushMessage__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
FORK\_\-msg\_\-hdr \hyperlink{struct__FlushMessage_o0}{hdr}
\item 
\hyperlink{struct__ASC}{ASC} $\ast$ \hyperlink{struct__FlushMessage_o1}{asc}
\end{CompactItemize}


\subsection{Detailed Description}
Flush fork message structure. 



\subsection{Field Documentation}
\hypertarget{struct__FlushMessage_o1}{
\index{_FlushMessage@{\_\-Flush\-Message}!asc@{asc}}
\index{asc@{asc}!_FlushMessage@{\_\-Flush\-Message}}
\subsubsection[asc]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__ASC}{ASC}$\ast$ \hyperlink{struct__FlushMessage_o1}{\_\-Flush\-Message::asc}}}
\label{struct__FlushMessage_o1}


The ASC control structure \hypertarget{struct__FlushMessage_o0}{
\index{_FlushMessage@{\_\-Flush\-Message}!hdr@{hdr}}
\index{hdr@{hdr}!_FlushMessage@{\_\-Flush\-Message}}
\subsubsection[hdr]{\setlength{\rightskip}{0pt plus 5cm}FORK\_\-msg\_\-hdr \hyperlink{struct__FlushMessage_o0}{\_\-Flush\-Message::hdr}}}
\label{struct__FlushMessage_o0}


The message header 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{ASC__eds_8c}{ASC\_\-eds.c}\end{CompactItemize}
