\hypertarget{struct__Flush}{
\section{\_\-Flush Struct Reference}
\label{struct__Flush}\index{_Flush@{\_\-Flush}}
}
Flush control structure.  


Collaboration diagram for \_\-Flush:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=258pt]{struct__Flush__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hyperlink{ASC__eds_8c_a8}{Flush\-Deliver\-Rtn} \hyperlink{struct__Flush_o0}{rtn}
\item 
void $\ast$ \hyperlink{struct__Flush_o1}{ctx}
\item 
\hyperlink{struct__FlushMessage}{Flush\-Message} \hyperlink{struct__Flush_o2}{msg}
\item 
int \hyperlink{struct__Flush_o3}{cnt}
\item 
unsigned long long int \hyperlink{struct__Flush_o4}{nsecx}
\item 
WUT\_\-tmr \hyperlink{struct__Flush_o5}{tmr}
\end{CompactItemize}


\subsection{Detailed Description}
Flush control structure. 



\subsection{Field Documentation}
\hypertarget{struct__Flush_o3}{
\index{_Flush@{\_\-Flush}!cnt@{cnt}}
\index{cnt@{cnt}!_Flush@{\_\-Flush}}
\subsubsection[cnt]{\setlength{\rightskip}{0pt plus 5cm}int \hyperlink{struct__Flush_o3}{\_\-Flush::cnt}}}
\label{struct__Flush_o3}


Flush on every N histogrammed \hypertarget{struct__Flush_o1}{
\index{_Flush@{\_\-Flush}!ctx@{ctx}}
\index{ctx@{ctx}!_Flush@{\_\-Flush}}
\subsubsection[ctx]{\setlength{\rightskip}{0pt plus 5cm}void$\ast$ \hyperlink{struct__Flush_o1}{\_\-Flush::ctx}}}
\label{struct__Flush_o1}


Context parameter for delivery routine \hypertarget{struct__Flush_o2}{
\index{_Flush@{\_\-Flush}!msg@{msg}}
\index{msg@{msg}!_Flush@{\_\-Flush}}
\subsubsection[msg]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__FlushMessage}{Flush\-Message} \hyperlink{struct__Flush_o2}{\_\-Flush::msg}}}
\label{struct__Flush_o2}


Flush Message \hypertarget{struct__Flush_o4}{
\index{_Flush@{\_\-Flush}!nsecx@{nsecx}}
\index{nsecx@{nsecx}!_Flush@{\_\-Flush}}
\subsubsection[nsecx]{\setlength{\rightskip}{0pt plus 5cm}unsigned long long int \hyperlink{struct__Flush_o4}{\_\-Flush::nsecx}}}
\label{struct__Flush_o4}


Flush every N nseconds \hypertarget{struct__Flush_o0}{
\index{_Flush@{\_\-Flush}!rtn@{rtn}}
\index{rtn@{rtn}!_Flush@{\_\-Flush}}
\subsubsection[rtn]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{ASC__eds_8c_a8}{Flush\-Deliver\-Rtn} \hyperlink{struct__Flush_o0}{\_\-Flush::rtn}}}
\label{struct__Flush_o0}


Delivery routine \hypertarget{struct__Flush_o5}{
\index{_Flush@{\_\-Flush}!tmr@{tmr}}
\index{tmr@{tmr}!_Flush@{\_\-Flush}}
\subsubsection[tmr]{\setlength{\rightskip}{0pt plus 5cm}WUT\_\-tmr \hyperlink{struct__Flush_o5}{\_\-Flush::tmr}}}
\label{struct__Flush_o5}


Flush timer 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{ASC__eds_8c}{ASC\_\-eds.c}\end{CompactItemize}
