\hypertarget{displaytest_8c}{
\section{displaytest.c File Reference}
\label{displaytest_8c}\index{displaytest.c@{displaytest.c}}
}
Program to test the EFC\_\-displayAcdTkr routine.  




\subsection{Detailed Description}
Program to test the EFC\_\-displayAcdTkr routine. 

Usage: $>$ displaytest which

\begin{Desc}
\item[]This program tests the EFC\_\-displayAcdTkr routine be producing a set of known, recogniziable patterns. In the default mode a fixed set of patterns are produced. If a parameter is supplied only that pattern is produced.\end{Desc}
\begin{Desc}
\item[The parameter {\em which\/} determines which tower will have a]full length track displayed and which ACD tiles will be displayed. The tower number is modulo 16 and the tiles to be displayed are that tile number from each list, {\em i.e\/}. the top and two side lists.\end{Desc}
\begin{Desc}
\item[Author:]JJRussell - \href{mailto:russell@slac.stanford.edu}{\tt russell@slac.stanford.edu}\end{Desc}


\footnotesize\begin{verbatim}

    CVS $Id: displaytest.c,v 1.3 2011/03/27 04:55:30 russell Exp $
\end{verbatim}
\normalsize
 