\hypertarget{dir_000007}{
\section{/afs/slac.stanford.edu/g/glast/flight/PHY/source/EFC/dev/src/ Directory Reference}
\label{dir_000007}\index{/afs/slac.stanford.edu/g/glast/flight/PHY/source/EFC/dev/src/ Directory Reference@{/afs/slac.stanford.edu/g/glast/flight/PHY/source/EFC/dev/src/ Directory Reference}}
}


\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=61pt]{dir_000007_dep}
\end{center}
\end{figure}
\subsection*{Files}
\begin{CompactItemize}
\item 
file \hyperlink{EDM_8c}{EDM.c}
\begin{CompactList}\small\item\em Event Diagnostic Message services, implementation. \item\end{CompactList}

\item 
file \hyperlink{EFC__display_8c}{EFC\_\-display.c}
\begin{CompactList}\small\item\em Crude Ascii display of ACD and TKR data. \item\end{CompactList}

\item 
file \hyperlink{EFC__samplerDef_8h}{EFC\_\-sampler\-Def.h}
\begin{CompactList}\small\item\em Defines the sampling structure. \item\end{CompactList}

\item 
file \hyperlink{EFC__samplerPrint_8c}{EFC\_\-sampler\-Print.c}
\begin{CompactList}\small\item\em Implementation of the EFC sampler print routines. \item\end{CompactList}

\item 
file \hyperlink{TFC__geometryDef_8h}{TFC\_\-geometry\-Def.h}
\begin{CompactList}\small\item\em Defines the tower geometry used in track finding. \item\end{CompactList}

\item 
file \hyperlink{TFC__geometryPrint_8c}{TFC\_\-geometry\-Print.c}
\begin{CompactList}\small\item\em Routines to print the geometry of the LAT. These are primarily used for debugging and tracking the TKR geometry structure. \item\end{CompactList}

\item 
file \hyperlink{TFC__prjPrint_8c}{TFC\_\-prj\-Print.c}
\begin{CompactList}\small\item\em Defines the implementation for the projection printing routines. These routines are for diagnostic and debugging purposes only. \item\end{CompactList}

\end{CompactItemize}
