\hypertarget{struct__GammaCfgZbottom}{
\section{\_\-GammaCfgZbottom Struct Reference}
\label{struct__GammaCfgZbottom}\index{\_\-GammaCfgZbottom@{\_\-GammaCfgZbottom}}
}
Control structure for the TKR/CAL matching, no TKR pattern regcognition, just bare continuity.  


{\tt \#include $<$GFC\_\-def.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
int \hyperlink{struct__GammaCfgZbottom_963c93bfd1aa80604ead621771d6029d}{emin}
\end{CompactItemize}


\subsection{Detailed Description}
Control structure for the TKR/CAL matching, no TKR pattern regcognition, just bare continuity. 

\subsection{Member Data Documentation}
\hypertarget{struct__GammaCfgZbottom_963c93bfd1aa80604ead621771d6029d}{
\index{\_\-GammaCfgZbottom@{\_\-GammaCfgZbottom}!emin@{emin}}
\index{emin@{emin}!_GammaCfgZbottom@{\_\-GammaCfgZbottom}}
\subsubsection[{emin}]{\setlength{\rightskip}{0pt plus 5cm}int {\bf \_\-GammaCfgZbottom::emin}}}
\label{struct__GammaCfgZbottom_963c93bfd1aa80604ead621771d6029d}


The minimum, typically 100MeV, for the cut to be applied GFC\_\-STATUS\_\-M\_\-ZBOTTOM 

Referenced by compileCfgPrms().

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{GFC__def_8h}{GFC\_\-def.h}\end{CompactItemize}
