\hypertarget{struct__GFC}{
\section{\_\-GFC Struct Reference}
\label{struct__GFC}\index{\_\-GFC@{\_\-GFC}}
}
A gathering place for all the information needed to drive the filter.  


{\tt \#include $<$GFC\_\-def.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hyperlink{struct__GFC__cfg}{GFC\_\-cfg} $\ast$ \hyperlink{struct__GFC_a47be41804899819a0bc3e1e7d3e05fa}{cfg}
\item 
\hyperlink{struct__GammaCtxRestart}{GammaCtxRestart} \hyperlink{struct__GFC_4a93a4154c3dd34b50b120530da46ce7}{restart}
\end{CompactItemize}


\subsection{Detailed Description}
A gathering place for all the information needed to drive the filter. 

\subsection{Member Data Documentation}
\hypertarget{struct__GFC_a47be41804899819a0bc3e1e7d3e05fa}{
\index{\_\-GFC@{\_\-GFC}!cfg@{cfg}}
\index{cfg@{cfg}!_GFC@{\_\-GFC}}
\subsubsection[{cfg}]{\setlength{\rightskip}{0pt plus 5cm}{\bf GFC\_\-cfg}$\ast$ {\bf \_\-GFC::cfg}}}
\label{struct__GFC_a47be41804899819a0bc3e1e7d3e05fa}


Configuration information 

Referenced by gammaFilter(), and GFC\_\-cfgSet().\hypertarget{struct__GFC_4a93a4154c3dd34b50b120530da46ce7}{
\index{\_\-GFC@{\_\-GFC}!restart@{restart}}
\index{restart@{restart}!_GFC@{\_\-GFC}}
\subsubsection[{restart}]{\setlength{\rightskip}{0pt plus 5cm}{\bf GammaCtxRestart} {\bf \_\-GFC::restart}}}
\label{struct__GFC_4a93a4154c3dd34b50b120530da46ce7}


Restart information 

Referenced by gammaFilter().

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{GFC__def_8h}{GFC\_\-def.h}\end{CompactItemize}
