\hypertarget{struct__GammaCfgAtf}{
\section{\_\-GammaCfgAtf Struct Reference}
\label{struct__GammaCfgAtf}\index{\_\-GammaCfgAtf@{\_\-GammaCfgAtf}}
}
Control structure for the ACD/TKR matching, no TKR pattern regcognition, just bit matching.  


{\tt \#include $<$GFC\_\-def.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
int \hyperlink{struct__GammaCfgAtf_6b009d8c3ffc4c7823d864eeba4ed73b}{emax}
\item 
const \hyperlink{struct__ATF__shadowedTowers}{ATF\_\-shadowedTowers} $\ast$ \hyperlink{struct__GammaCfgAtf_ae2005e2e37d744bbdb1b9a4ccd7193f}{shadowed}
\end{CompactItemize}


\subsection{Detailed Description}
Control structure for the ACD/TKR matching, no TKR pattern regcognition, just bit matching. 

\subsection{Member Data Documentation}
\hypertarget{struct__GammaCfgAtf_6b009d8c3ffc4c7823d864eeba4ed73b}{
\index{\_\-GammaCfgAtf@{\_\-GammaCfgAtf}!emax@{emax}}
\index{emax@{emax}!_GammaCfgAtf@{\_\-GammaCfgAtf}}
\subsubsection[{emax}]{\setlength{\rightskip}{0pt plus 5cm}int {\bf \_\-GammaCfgAtf::emax}}}
\label{struct__GammaCfgAtf_6b009d8c3ffc4c7823d864eeba4ed73b}


The maximum energy, typically 5GeV, to apply the cut, GFC\_\-STATUS\_\-M\_\-TOP, \_\-SIDE 

Referenced by compileCfgPrms(), evaluateAtf(), and printCfg().\hypertarget{struct__GammaCfgAtf_ae2005e2e37d744bbdb1b9a4ccd7193f}{
\index{\_\-GammaCfgAtf@{\_\-GammaCfgAtf}!shadowed@{shadowed}}
\index{shadowed@{shadowed}!_GammaCfgAtf@{\_\-GammaCfgAtf}}
\subsubsection[{shadowed}]{\setlength{\rightskip}{0pt plus 5cm}const {\bf ATF\_\-shadowedTowers}$\ast$ {\bf \_\-GammaCfgAtf::shadowed}}}
\label{struct__GammaCfgAtf_ae2005e2e37d744bbdb1b9a4ccd7193f}


The shadowed towers 

Referenced by compileCfgPrms(), evaluateAtf(), and printCfg().

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{GFC__def_8h}{GFC\_\-def.h}\end{CompactItemize}
