\hypertarget{tkrremaptest_8c}{
\section{tkrremaptest.c File Reference}
\label{tkrremaptest_8c}\index{tkrremaptest.c@{tkrremaptest.c}}
}
Program to test the remapping of the TKR layer bits from the order given in the EBF data to the canonical numbering.  


{\tt \#include $<$stdio.h$>$}\par
{\tt \#include $<$stdlib.h$>$}\par
{\tt \#include $<$EDS/EBF\_\-tkr.h$>$}\par
{\tt \#include $<$EDS/TMR.h$>$}\par


\subsection{Detailed Description}
Program to test the remapping of the TKR layer bits from the order given in the EBF data to the canonical numbering. 



\footnotesize\begin{verbatim}
            Usage:
            > tkrremaptest
   \end{verbatim}
\normalsize


\begin{Desc}
\item[Author:]JJRussell - \href{mailto:russell@slac.stanford.edu}{\tt russell@slac.stanford.edu}\end{Desc}


\footnotesize\begin{verbatim}

    CVS $Id: tkrremaptest.c,v 1.3 2011/03/27 04:55:30 russell Exp $
\end{verbatim}
\normalsize
 