\hypertarget{struct__GammaCfgZbottom}{
\section{\_\-Gamma\-Cfg\-Zbottom Struct Reference}
\label{struct__GammaCfgZbottom}\index{_GammaCfgZbottom@{\_\-GammaCfgZbottom}}
}
Control structure for the TKR/CAL matching, no TKR pattern regcognition, just bare continuity.  


{\tt \#include $<$GFC\_\-def.h$>$}

\subsection*{Data Fields}
\begin{CompactItemize}
\item 
int \hyperlink{struct__GammaCfgZbottom_o0}{emin}
\end{CompactItemize}


\subsection{Detailed Description}
Control structure for the TKR/CAL matching, no TKR pattern regcognition, just bare continuity. 



\subsection{Field Documentation}
\hypertarget{struct__GammaCfgZbottom_o0}{
\index{_GammaCfgZbottom@{\_\-Gamma\-Cfg\-Zbottom}!emin@{emin}}
\index{emin@{emin}!_GammaCfgZbottom@{\_\-Gamma\-Cfg\-Zbottom}}
\subsubsection[emin]{\setlength{\rightskip}{0pt plus 5cm}int \hyperlink{struct__GammaCfgZbottom_o0}{\_\-Gamma\-Cfg\-Zbottom::emin}}}
\label{struct__GammaCfgZbottom_o0}


The minimum, typically 100Me\-V, for the cut to be applied GFC\_\-STATUS\_\-M\_\-ZBOTTOM 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{GFC__def_8h}{GFC\_\-def.h}\end{CompactItemize}
