\hypertarget{struct__GammaCfgAtf}{
\section{\_\-Gamma\-Cfg\-Atf Struct Reference}
\label{struct__GammaCfgAtf}\index{_GammaCfgAtf@{\_\-GammaCfgAtf}}
}
Control structure for the ACD/TKR matching, no TKR pattern regcognition, just bit matching.  


{\tt \#include $<$GFC\_\-def.h$>$}

Collaboration diagram for \_\-Gamma\-Cfg\-Atf:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=84pt]{struct__GammaCfgAtf__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
unsigned int \hyperlink{struct__GammaCfgAtf_o0}{emax}
\item 
const \hyperlink{struct__ATF__shadowedTowers}{ATF\_\-shadowed\-Towers} $\ast$ \hyperlink{struct__GammaCfgAtf_o1}{shadowed}
\end{CompactItemize}


\subsection{Detailed Description}
Control structure for the ACD/TKR matching, no TKR pattern regcognition, just bit matching. 



\subsection{Field Documentation}
\hypertarget{struct__GammaCfgAtf_o0}{
\index{_GammaCfgAtf@{\_\-Gamma\-Cfg\-Atf}!emax@{emax}}
\index{emax@{emax}!_GammaCfgAtf@{\_\-Gamma\-Cfg\-Atf}}
\subsubsection[emax]{\setlength{\rightskip}{0pt plus 5cm}unsigned int \hyperlink{struct__GammaCfgAtf_o0}{\_\-Gamma\-Cfg\-Atf::emax}}}
\label{struct__GammaCfgAtf_o0}


The maximum energy, typically 5Ge\-V, to apply the cut, GFC\_\-STATUS\_\-M\_\-TOP, \_\-SIDE \hypertarget{struct__GammaCfgAtf_o1}{
\index{_GammaCfgAtf@{\_\-Gamma\-Cfg\-Atf}!shadowed@{shadowed}}
\index{shadowed@{shadowed}!_GammaCfgAtf@{\_\-Gamma\-Cfg\-Atf}}
\subsubsection[shadowed]{\setlength{\rightskip}{0pt plus 5cm}const \hyperlink{struct__ATF__shadowedTowers}{ATF\_\-shadowed\-Towers}$\ast$ \hyperlink{struct__GammaCfgAtf_o1}{\_\-Gamma\-Cfg\-Atf::shadowed}}}
\label{struct__GammaCfgAtf_o1}


The shadowed towers 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{GFC__def_8h}{GFC\_\-def.h}\end{CompactItemize}
