\hypertarget{struct__GFC}{
\section{\_\-GFC Struct Reference}
\label{struct__GFC}\index{_GFC@{\_\-GFC}}
}
A gathering place for all the information needed to drive the filter.  


{\tt \#include $<$GFC\_\-def.h$>$}

\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hyperlink{struct__GFC__cfg}{GFC\_\-cfg} $\ast$ \hyperlink{struct__GFC_o0}{cfg}
\item 
\hyperlink{struct__GammaCtxRestart}{Gamma\-Ctx\-Restart} \hyperlink{struct__GFC_o1}{restart}
\end{CompactItemize}


\subsection{Detailed Description}
A gathering place for all the information needed to drive the filter. 



\subsection{Field Documentation}
\hypertarget{struct__GFC_o0}{
\index{_GFC@{\_\-GFC}!cfg@{cfg}}
\index{cfg@{cfg}!_GFC@{\_\-GFC}}
\subsubsection[cfg]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__GFC__cfg}{GFC\_\-cfg}$\ast$ \hyperlink{struct__GFC_o0}{\_\-GFC::cfg}}}
\label{struct__GFC_o0}


Configuration information \hypertarget{struct__GFC_o1}{
\index{_GFC@{\_\-GFC}!restart@{restart}}
\index{restart@{restart}!_GFC@{\_\-GFC}}
\subsubsection[restart]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__GammaCtxRestart}{Gamma\-Ctx\-Restart} \hyperlink{struct__GFC_o1}{\_\-GFC::restart}}}
\label{struct__GFC_o1}


Restart information 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{GFC__def_8h}{GFC\_\-def.h}\end{CompactItemize}
