\hypertarget{struct__RestartPkt}{
\section{\_\-Restart\-Pkt Struct Reference}
\label{struct__RestartPkt}\index{_RestartPkt@{\_\-RestartPkt}}
}
Defines an EBF restart packet.  


Collaboration diagram for \_\-Restart\-Pkt:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=144pt]{struct__RestartPkt__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hyperlink{struct__EBF__pktHdr}{EBF\_\-pkt\-Hdr} \hyperlink{struct__RestartPkt_o0}{hdr}
\item 
\hyperlink{struct__EBF__pktRestartCell}{EBF\_\-pkt\-Restart\-Cell} \hyperlink{struct__RestartPkt_o1}{cell}
\end{CompactItemize}


\subsection{Detailed Description}
Defines an EBF restart packet. 



\subsection{Field Documentation}
\hypertarget{struct__RestartPkt_o1}{
\index{_RestartPkt@{\_\-Restart\-Pkt}!cell@{cell}}
\index{cell@{cell}!_RestartPkt@{\_\-Restart\-Pkt}}
\subsubsection[cell]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__EBF__pktRestartCell}{EBF\_\-pkt\-Restart\-Cell} \hyperlink{struct__RestartPkt_o1}{\_\-Restart\-Pkt::cell}}}
\label{struct__RestartPkt_o1}


Standard restart cell \hypertarget{struct__RestartPkt_o0}{
\index{_RestartPkt@{\_\-Restart\-Pkt}!hdr@{hdr}}
\index{hdr@{hdr}!_RestartPkt@{\_\-Restart\-Pkt}}
\subsubsection[hdr]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__EBF__pktHdr}{EBF\_\-pkt\-Hdr} \hyperlink{struct__RestartPkt_o0}{\_\-Restart\-Pkt::hdr}}}
\label{struct__RestartPkt_o0}


Standard packet header 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{EBF__stream_8c}{EBF\_\-stream.c}\end{CompactItemize}
