\section{File List}
Here is a list of all documented files with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{EBF__ebw_8h}{EBF\_\-ebw.h} (Layouts out the fields of the Event Builder Word )}{\pageref{EBF__ebw_8h}}{}
\item\contentsline{section}{\hyperlink{EBF__edw_8h}{EBF\_\-edw.h} (Layouts out the fields of the LCB Event (or more properly) Packet Descriptor Word packet )}{\pageref{EBF__edw_8h}}{}
\item\contentsline{section}{\hyperlink{EBF__pkt_8h}{EBF\_\-pkt.h} (Defines the attributes and data structures relating to an EBF packet )}{\pageref{EBF__pkt_8h}}{}
\item\contentsline{section}{\hyperlink{EBF__pkt_8ih}{EBF\_\-pkt.ih} (Defines the inlines associated with the packet header )}{\pageref{EBF__pkt_8ih}}{}
\item\contentsline{section}{\hyperlink{ebf__tkrtest_8c}{ebf\_\-tkrtest.c} (Program to test the utility functions in EBF\_\-tkr )}{\pageref{ebf__tkrtest_8c}}{}
\item\contentsline{section}{\hyperlink{EDS__endianness_8h}{EDS\_\-endianness.h} (Provides definitions of the ENDIANNESS of the target machine. The symbols {\em ENDIANNESS\_\-IS\_\-LITTLE\/} and {\em ENDIANNESS\_\-IS\_\-BIG\/} should be used in preprocessing directives to determine the endianness of the machine, while the symbol {\em ENDIANNESS\/} can be more easily used in 'C' code )}{\pageref{EDS__endianness_8h}}{}
\item\contentsline{section}{\hyperlink{EDS__fwServices_8h}{EDS\_\-fw\-Services.h} (Defines the handler related services and parameters that are needed to register a handler )}{\pageref{EDS__fwServices_8h}}{}
\item\contentsline{section}{\hyperlink{EDS__rsd_8h}{EDS\_\-rsd.h} (Result Summary Data Structures )}{\pageref{EDS__rsd_8h}}{}
\end{CompactList}
