\hypertarget{struct__RestartPkt}{
\section{\_\-RestartPkt Struct Reference}
\label{struct__RestartPkt}\index{\_\-RestartPkt@{\_\-RestartPkt}}
}
Defines an EBF restart packet.  


\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hyperlink{struct__EBF__pktHdr}{EBF\_\-pktHdr} \hyperlink{struct__RestartPkt_5b46b721f70f537b6884b2f00e6a2dbd}{hdr}
\item 
\hyperlink{struct__EBF__pktRestartCell}{EBF\_\-pktRestartCell} \hyperlink{struct__RestartPkt_f2bab32c52d89235b90a636f8aa98148}{cell}
\end{CompactItemize}


\subsection{Detailed Description}
Defines an EBF restart packet. 

\subsection{Member Data Documentation}
\hypertarget{struct__RestartPkt_f2bab32c52d89235b90a636f8aa98148}{
\index{\_\-RestartPkt@{\_\-RestartPkt}!cell@{cell}}
\index{cell@{cell}!_RestartPkt@{\_\-RestartPkt}}
\subsubsection[{cell}]{\setlength{\rightskip}{0pt plus 5cm}{\bf EBF\_\-pktRestartCell} {\bf \_\-RestartPkt::cell}}}
\label{struct__RestartPkt_f2bab32c52d89235b90a636f8aa98148}


Standard restart cell 

Referenced by EBF\_\-streamEvtxWrite(), and restart\_\-construct().\hypertarget{struct__RestartPkt_5b46b721f70f537b6884b2f00e6a2dbd}{
\index{\_\-RestartPkt@{\_\-RestartPkt}!hdr@{hdr}}
\index{hdr@{hdr}!_RestartPkt@{\_\-RestartPkt}}
\subsubsection[{hdr}]{\setlength{\rightskip}{0pt plus 5cm}{\bf EBF\_\-pktHdr} {\bf \_\-RestartPkt::hdr}}}
\label{struct__RestartPkt_5b46b721f70f537b6884b2f00e6a2dbd}


Standard packet header 

Referenced by EBF\_\-streamEvtxWrite(), and restart\_\-construct().

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{EBF__stream_8c}{EBF\_\-stream.c}\end{CompactItemize}
