\hypertarget{dir_d74b29e715868e576657fea4f151c704}{
\section{/afs/slac.stanford.edu/g/glast/flight/PHY/source/EDS/V2-12-1/src/ Directory Reference}
\label{dir_d74b29e715868e576657fea4f151c704}\index{/afs/slac.stanford.edu/g/glast/flight/PHY/source/EDS/V2-12-1/src/ Directory Reference@{/afs/slac.stanford.edu/g/glast/flight/PHY/source/EDS/V2-12-1/src/ Directory Reference}}
}
\subsection*{Files}
\begin{CompactItemize}
\item 
file \hyperlink{ACD__map_8c}{ACD\_\-map.c}
\begin{CompactList}\small\item\em Defines the mapping arrays to translate between ACD electronics channel numbering and ACD geometric channel numbering. \item\end{CompactList}

\item 
file \hyperlink{ACD__mapdef_8h}{ACD\_\-mapdef.h}
\begin{CompactList}\small\item\em Defines symbols used in doing mappings to/from ACD electronics channels from/to geometric numbering. The geometric numbering is as the ACD tiles are laid out in the GEM ACD data. \item\end{CompactList}

\item 
file \hyperlink{ACD__names_8c}{ACD\_\-names.c}
\begin{CompactList}\small\item\em The routines and data to give the standard names of the ACD cables and offline addresses. \item\end{CompactList}

\item 
file \hyperlink{ACD__print_8c}{ACD\_\-print.c}
\begin{CompactList}\small\item\em Prints a formatted dump of an ACD\_\-rec. \item\end{CompactList}

\item 
file \hyperlink{EBF__dirPrint_8c}{EBF\_\-dirPrint.c}
\begin{CompactList}\small\item\em EBF Print Utilities. \item\end{CompactList}

\item 
file \hyperlink{EBF__pktPrint_8c}{EBF\_\-pktPrint.c}
\begin{CompactList}\small\item\em Prints a crude hex dump of and EBF packet. \item\end{CompactList}

\item 
file \hyperlink{EBF__tkr_8c}{EBF\_\-tkr.c}
\begin{CompactList}\small\item\em Utility routines to partially parse the tracker data. \item\end{CompactList}

\item 
file \hyperlink{ECR__acdPrint_8c}{ECR\_\-acdPrint.c}
\begin{CompactList}\small\item\em Prints the specified set of ACD calibration constants. This is purely a diagnostic routine. \item\end{CompactList}

\item 
file \hyperlink{ECR__calPrint_8c}{ECR\_\-calPrint.c}
\begin{CompactList}\small\item\em Prints the specified set of CAL calibration constants. This is purely a diagnostic routine. \item\end{CompactList}

\item 
file \hyperlink{EDR__acdPrint_8c}{EDR\_\-acdPrint.c}
\begin{CompactList}\small\item\em Provides an ASCII print out of the unpacked ACD data and also its supporting data structures. \item\end{CompactList}

\item 
file \hyperlink{EDR__calPrint_8c}{EDR\_\-calPrint.c}
\begin{CompactList}\small\item\em Defines the implementaion of the CAL LAT record print routine. \item\end{CompactList}

\item 
file \hyperlink{EDR__gemPrint_8c}{EDR\_\-gemPrint.c}
\begin{CompactList}\small\item\em Produces an ASCII display of the GEM information. \item\end{CompactList}

\item 
file \hyperlink{EDR__mcPrint_8c}{EDR\_\-mcPrint.c}
\begin{CompactList}\small\item\em Produces an ASCII display of the header when it contains Monte Carlo information. \item\end{CompactList}

\item 
file \hyperlink{EDR__tkrPrint_8c}{EDR\_\-tkrPrint.c}
\begin{CompactList}\small\item\em Prints an ASCII display of the TKR tracker data. \item\end{CompactList}

\end{CompactItemize}
