\section{File List}
Here is a list of all documented files with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{EBF__ebw_8h}{EBF\_\-ebw.h} (Layouts out the fields of the Event Builder Word )}{\pageref{EBF__ebw_8h}}{}
\item\contentsline{section}{\hyperlink{EBF__edw_8h}{EBF\_\-edw.h} (Layouts out the fields of the LCB Event (or more properly) Packet Descriptor Word packet )}{\pageref{EBF__edw_8h}}{}
\item\contentsline{section}{\hyperlink{EBF__esw_8h}{EBF\_\-esw.h} (Describes the Event Summary Word put on each contributor by The Event Builder Module )}{\pageref{EBF__esw_8h}}{}
\item\contentsline{section}{\hyperlink{EBF__match_8h}{EBF\_\-match.h} (Interface to the EBW and ESW contributor header word matching )}{\pageref{EBF__match_8h}}{}
\item\contentsline{section}{\hyperlink{EBF__pkt_8h}{EBF\_\-pkt.h} (Defines the attributes and data structures relating to an EBF packet )}{\pageref{EBF__pkt_8h}}{}
\item\contentsline{section}{\hyperlink{EBF__pkt_8ih}{EBF\_\-pkt.ih} (Defines the inlines associated with the packet header )}{\pageref{EBF__pkt_8ih}}{}
\item\contentsline{section}{\hyperlink{ebf__print_8c}{ebf\_\-print.c} (Crude program to read and print the contents of an Event Builder Format file to stdout )}{\pageref{ebf__print_8c}}{}
\item\contentsline{section}{\hyperlink{EDA__cal_8h}{EDA\_\-cal.h} (Defines the event and data attributes (constants) for the CAL )}{\pageref{EDA__cal_8h}}{}
\item\contentsline{section}{\hyperlink{EDS__endianness_8h}{EDS\_\-endianness.h} (Provides definitions of the ENDIANNESS of the target machine. The symbols {\em ENDIANNESS\_\-IS\_\-LITTLE\/} and {\em ENDIANNESS\_\-IS\_\-BIG\/} should be used in preprocessing directives to determine the endianness of the machine, while the symbol {\em ENDIANNESS\/} can be more easily used in 'C' code )}{\pageref{EDS__endianness_8h}}{}
\item\contentsline{section}{\hyperlink{EDS__fwServices_8h}{EDS\_\-fwServices.h} (Defines the handler related services and parameters that are needed to register a handler )}{\pageref{EDS__fwServices_8h}}{}
\item\contentsline{section}{\hyperlink{EDS__rsd_8h}{EDS\_\-rsd.h} (Result Summary Data Structures )}{\pageref{EDS__rsd_8h}}{}
\end{CompactList}
