\section{File List}
Here is a list of all documented files with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{EBF__cid_8h}{EBF\_\-cid.h} (Maps out the contributor IDs as defined by the Event Builder )}{\pageref{EBF__cid_8h}}{}
\item\contentsline{section}{\hyperlink{EBF__ctb_8h}{EBF\_\-ctb.h} (Describes the attributes and data structures relating to individual contributors )}{\pageref{EBF__ctb_8h}}{}
\item\contentsline{section}{\hyperlink{EBF__dir_8h}{EBF\_\-dir.h} (EBF dir services, Interface )}{\pageref{EBF__dir_8h}}{}
\item\contentsline{section}{\hyperlink{ebf__dirtest_8c}{ebf\_\-dirtest.c} (Tests various features of the EBF\_\-dir utilities )}{\pageref{ebf__dirtest_8c}}{}
\item\contentsline{section}{\hyperlink{EBF__ebw_8h}{EBF\_\-ebw.h} (Layouts out the fields of the Event Builder Word )}{\pageref{EBF__ebw_8h}}{}
\item\contentsline{section}{\hyperlink{EBF__edw_8h}{EBF\_\-edw.h} (Layouts out the fields of the LCB Event (or more properly) Packet Descriptor Word packet )}{\pageref{EBF__edw_8h}}{}
\item\contentsline{section}{\hyperlink{EBF__esw_8h}{EBF\_\-esw.h} (Describes the Event Summary Word put on each contributor by The Event Builder Module )}{\pageref{EBF__esw_8h}}{}
\item\contentsline{section}{\hyperlink{EBF__pkt_8h}{EBF\_\-pkt.h} (Defines the attributes and data structures relating to an EBF packet )}{\pageref{EBF__pkt_8h}}{}
\item\contentsline{section}{\hyperlink{EBF__pkt_8ih}{EBF\_\-pkt.ih} (Defines the inlines associated with the packet header )}{\pageref{EBF__pkt_8ih}}{}
\item\contentsline{section}{\hyperlink{EBF__pktPrint_8c}{EBF\_\-pktPrint.c} (Prints a crude hex dump of and EBF packet )}{\pageref{EBF__pktPrint_8c}}{}
\item\contentsline{section}{\hyperlink{EBF__pktPrint_8h}{EBF\_\-pktPrint.h} (EBF packet print utilities , Interface )}{\pageref{EBF__pktPrint_8h}}{}
\item\contentsline{section}{\hyperlink{EDS__endianness_8h}{EDS\_\-endianness.h} (Provides definitions of the ENDIANNESS of the target machine. The symbols {\em ENDIANNESS\_\-IS\_\-LITTLE\/} and {\em ENDIANNESS\_\-IS\_\-BIG\/} should be used in preprocessing directives to determine the endianness of the machine, while the symbol {\em ENDIANNESS\/} can be more easily used in 'C' code )}{\pageref{EDS__endianness_8h}}{}
\item\contentsline{section}{\hyperlink{EDS__fwServices_8h}{EDS\_\-fwServices.h} (Defines the handler related services and parameters that are needed to register a handler )}{\pageref{EDS__fwServices_8h}}{}
\item\contentsline{section}{\hyperlink{EDS__rsd_8h}{EDS\_\-rsd.h} (Result Summary Data Structures )}{\pageref{EDS__rsd_8h}}{}
\item\contentsline{section}{\hyperlink{EDSD__siv_8h}{EDSD\_\-siv.h} (Demonstration and test routines for EBF\_\-siv, State Information Vector )}{\pageref{EDSD__siv_8h}}{}
\item\contentsline{section}{\hyperlink{FFS_8h}{FFS.h} (Provides the interface and implementation of the Find First Set routines )}{\pageref{FFS_8h}}{}
\item\contentsline{section}{\hyperlink{FFS_8xx-x86-gcc_8h}{FFS.xx-x86-gcc.h} (FFS, X86 and GCC platform specific implementation )}{\pageref{FFS_8xx-x86-gcc_8h}}{}
\end{CompactList}
