\hypertarget{structCptDescription}{
\section{CptDescription Struct Reference}
\label{structCptDescription}\index{CptDescription@{CptDescription}}
}
Description of a component of the LAT.  


{\tt \#include $<$RIM\_\-p.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hypertarget{structCptDescription_f494cbd5175d78f78358fcbdfb818101}{
unsigned \hyperlink{structCptDescription_f494cbd5175d78f78358fcbdfb818101}{width}}
\label{structCptDescription_f494cbd5175d78f78358fcbdfb818101}

\begin{CompactList}\small\item\em Width of the registers of this component. \item\end{CompactList}\item 
\hypertarget{structCptDescription_449e3e205419fea89a3dad4ce8567c6f}{
unsigned \hyperlink{structCptDescription_449e3e205419fea89a3dad4ce8567c6f}{nregs}}
\label{structCptDescription_449e3e205419fea89a3dad4ce8567c6f}

\begin{CompactList}\small\item\em Number of registers in the component. \item\end{CompactList}\item 
\hypertarget{structCptDescription_8d6167b0e095fc8b36ff270ea3b92e14}{
const \hyperlink{structRegDescription}{RegDescription} $\ast$ \hyperlink{structCptDescription_8d6167b0e095fc8b36ff270ea3b92e14}{rd}}
\label{structCptDescription_8d6167b0e095fc8b36ff270ea3b92e14}

\begin{CompactList}\small\item\em Array of registers, the registers contained by the component. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Description of a component of the LAT. 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{RIM__p_8h}{RIM\_\-p.h}\end{CompactItemize}
