\hypertarget{structRegDescription}{
\section{Reg\-Description Struct Reference}
\label{structRegDescription}\index{RegDescription@{RegDescription}}
}
Description of a register within a component.  


{\tt \#include $<$RIM\_\-p.h$>$}

Collaboration diagram for Reg\-Description:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=60pt]{structRegDescription__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hypertarget{structRegDescription_o0}{
unsigned \hyperlink{structRegDescription_o0}{reg\-Id}}
\label{structRegDescription_o0}

\begin{CompactList}\small\item\em Register ID (used in the LATp header to identify register. \item\end{CompactList}\item 
\hypertarget{structRegDescription_o1}{
unsigned \hyperlink{structRegDescription_o1}{nflds}}
\label{structRegDescription_o1}

\begin{CompactList}\small\item\em Number of fields in the register. \item\end{CompactList}\item 
\hypertarget{structRegDescription_o2}{
const \hyperlink{structFldDescription}{Fld\-Description} $\ast$ \hyperlink{structRegDescription_o2}{fd}}
\label{structRegDescription_o2}

\begin{CompactList}\small\item\em Array of fields, the fields contained by the register. \item\end{CompactList}\item 
\hypertarget{structRegDescription_o3}{
const char $\ast$ \hyperlink{structRegDescription_o3}{name}}
\label{structRegDescription_o3}

\begin{CompactList}\small\item\em The name of the register. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Description of a register within a component. 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{RIM__p_8h}{RIM\_\-p.h}\end{CompactItemize}
