\hypertarget{structCptDescription}{
\section{Cpt\-Description Struct Reference}
\label{structCptDescription}\index{CptDescription@{CptDescription}}
}
Description of a component of the LAT.  


{\tt \#include $<$RIM\_\-p.h$>$}

Collaboration diagram for Cpt\-Description:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=60pt]{structCptDescription__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hypertarget{structCptDescription_o0}{
unsigned \hyperlink{structCptDescription_o0}{width}}
\label{structCptDescription_o0}

\begin{CompactList}\small\item\em Width of the registers of this component. \item\end{CompactList}\item 
\hypertarget{structCptDescription_o1}{
unsigned \hyperlink{structCptDescription_o1}{nregs}}
\label{structCptDescription_o1}

\begin{CompactList}\small\item\em Number of registers in the component. \item\end{CompactList}\item 
\hypertarget{structCptDescription_o2}{
const \hyperlink{structRegDescription}{Reg\-Description} $\ast$ \hyperlink{structCptDescription_o2}{rd}}
\label{structCptDescription_o2}

\begin{CompactList}\small\item\em Array of registers, the registers contained by the component. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Description of a component of the LAT. 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{RIM__p_8h}{RIM\_\-p.h}\end{CompactItemize}
