\section{Data Structures}
Here are the data structures with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{struct__PIG__acd}{\_\-PIG\_\-acd} (ACD portion of the PIG cfg union )}{\pageref{struct__PIG__acd}}{}
\item\contentsline{section}{\hyperlink{struct__PIG__acd__bias}{\_\-PIG\_\-acd\_\-bias} (Bias voltage values for the ACD )}{\pageref{struct__PIG__acd__bias}}{}
\item\contentsline{section}{\hyperlink{struct__PIG__arc__bias}{\_\-PIG\_\-arc\_\-bias} (Bias voltage information for one FREE board )}{\pageref{struct__PIG__arc__bias}}{}
\item\contentsline{section}{\hyperlink{union__PIG__cfg}{\_\-PIG\_\-cfg} (Configuration for the PIG\_\-on and PIG\_\-off routines )}{\pageref{union__PIG__cfg}}{}
\item\contentsline{section}{\hyperlink{struct__PIG__cruState}{\_\-PIG\_\-cru\-State} (State of the CRU )}{\pageref{struct__PIG__cruState}}{}
\item\contentsline{section}{\hyperlink{struct__PIG__dbState}{\_\-PIG\_\-db\-State} (Structure holding all the registers that are configured by PIG\_\-DB )}{\pageref{struct__PIG__dbState}}{}
\item\contentsline{section}{\hyperlink{struct__PIG__ebm}{\_\-PIG\_\-ebm} (EBM portion of the PIG cfg union )}{\pageref{struct__PIG__ebm}}{}
\item\contentsline{section}{\hyperlink{struct__PIG__ebmState}{\_\-PIG\_\-ebm\-State} (Structure used to record the state of the EBM )}{\pageref{struct__PIG__ebmState}}{}
\item\contentsline{section}{\hyperlink{struct__PIG__epu}{\_\-PIG\_\-epu} (EPU portion of the PIG cfg union )}{\pageref{struct__PIG__epu}}{}
\item\contentsline{section}{\hyperlink{struct__PIG__evt__cfg}{\_\-PIG\_\-evt\_\-cfg} (Essentially a bit field indicating elements on the event fabric to be subsequently added to or removed from the event fabric )}{\pageref{struct__PIG__evt__cfg}}{}
\item\contentsline{section}{\hyperlink{struct__PIG__gem}{\_\-PIG\_\-gem} (GEM portion of the PIG cfg union )}{\pageref{struct__PIG__gem}}{}
\item\contentsline{section}{\hyperlink{struct__PIG__pdu}{\_\-PIG\_\-pdu} (PDU portion of the PIG cfg union )}{\pageref{struct__PIG__pdu}}{}
\item\contentsline{section}{\hyperlink{struct__PIG__pduState}{\_\-PIG\_\-pdu\-State} (State of the PDU )}{\pageref{struct__PIG__pduState}}{}
\item\contentsline{section}{\hyperlink{struct__PIG__pwrState}{\_\-PIG\_\-pwr\-State} (Structure holding all the power registers that are controlled by PIG )}{\pageref{struct__PIG__pwrState}}{}
\item\contentsline{section}{\hyperlink{struct__PIG__siu__cfg}{\_\-PIG\_\-siu\_\-cfg} (Configuration for the PIG\_\-siu routine, triggered by reception of a MAIN\_\-FEED\_\-ON notification from the SC )}{\pageref{struct__PIG__siu__cfg}}{}
\item\contentsline{section}{\hyperlink{union__PIG__siu__union}{\_\-PIG\_\-siu\_\-union} (Union of a PIG\_\-siu\_\-cfg structure and an unsigned )}{\pageref{union__PIG__siu__union}}{}
\item\contentsline{section}{\hyperlink{struct__PIG__state}{\_\-PIG\_\-state} (Combination of structure encapsulating the current state of the registers manipulated by PIG )}{\pageref{struct__PIG__state}}{}
\item\contentsline{section}{\hyperlink{struct__PIG__tem}{\_\-PIG\_\-tem} (TEM portion of the PIG cfg union )}{\pageref{struct__PIG__tem}}{}
\item\contentsline{section}{\hyperlink{struct__PIG__twr__bias}{\_\-PIG\_\-twr\_\-bias} (Bias voltage values for the CAL or TKR, along with mask of towers to modify )}{\pageref{struct__PIG__twr__bias}}{}
\end{CompactList}
