\section{Data Structures}
Here are the data structures with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{struct__BF__AEM__ACD__RSP}{\_\-BF\_\-AEM\_\-ACD\_\-RSP} (Encoding for responses from ACD off board electronics (GARC/GAFE) )}{\pageref{struct__BF__AEM__ACD__RSP}}{}
\item\contentsline{section}{\hyperlink{struct__BF__AEM__ENV__RSP}{\_\-BF\_\-AEM\_\-ENV\_\-RSP} (Map of the response from the AEM environmental monitor )}{\pageref{struct__BF__AEM__ENV__RSP}}{}
\item\contentsline{section}{\hyperlink{struct__BF__TEM__CAL__RSP}{\_\-BF\_\-TEM\_\-CAL\_\-RSP} (Encoding for responses from CAL off board electronics (CRC/CFE) )}{\pageref{struct__BF__TEM__CAL__RSP}}{}
\item\contentsline{section}{\hyperlink{struct__BF__TEM__TKR__FLAGS}{\_\-BF\_\-TEM\_\-TKR\_\-FLAGS} (Encoding for response status flags from TKR off board electronics (TRC/TFE) )}{\pageref{struct__BF__TEM__TKR__FLAGS}}{}
\item\contentsline{section}{\hyperlink{unionACD__rsp}{ACD\_\-rsp} (Union for 32-bit ACD response data )}{\pageref{unionACD__rsp}}{}
\item\contentsline{section}{\hyperlink{unionAEM__env__rsp}{AEM\_\-env\_\-rsp} (Union for 64-bit environmental monitor data )}{\pageref{unionAEM__env__rsp}}{}
\item\contentsline{section}{\hyperlink{unionCAL__rsp}{CAL\_\-rsp} (Union for 32-bit CAL response data )}{\pageref{unionCAL__rsp}}{}
\item\contentsline{section}{\hyperlink{structLEM__di}{LEM\_\-di} (Structure holding information required to decode a result )}{\pageref{structLEM__di}}{}
\item\contentsline{section}{\hyperlink{structPDU__env__rsp}{PDU\_\-env\_\-rsp} (Struct of three ui's which are the PDU statistics )}{\pageref{structPDU__env__rsp}}{}
\item\contentsline{section}{\hyperlink{structTIC__env__rsp}{TIC\_\-env\_\-rsp} (Structure containing the response to a TIC environment read )}{\pageref{structTIC__env__rsp}}{}
\item\contentsline{section}{\hyperlink{unionTKR__flags}{TKR\_\-flags} (Union for 16-bit TKR response flags )}{\pageref{unionTKR__flags}}{}
\item\contentsline{section}{\hyperlink{structTKR__rsp}{TKR\_\-rsp} (Structure containing the value read from a tracker register and any error flags )}{\pageref{structTKR__rsp}}{}
\end{CompactList}
