\hypertarget{structLCFG__decode}{
\section{LCFG\_\-decode Struct Reference}
\label{structLCFG__decode}\index{LCFG_decode@{LCFG\_\-decode}}
}
Structure used to hold information used in decoding the response to register read operations.  


{\tt \#include $<$LCFG\_\-p.h$>$}

\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hypertarget{structLCFG__decode_o0}{
LEM\_\-micr $\ast$ \hyperlink{structLCFG__decode_o0}{cr}}
\label{structLCFG__decode_o0}

\begin{CompactList}\small\item\em Pointer to command-response structure. \item\end{CompactList}\item 
\hypertarget{structLCFG__decode_o1}{
RIM\_\-rqst\-Info $\ast$ \hyperlink{structLCFG__decode_o1}{di}}
\label{structLCFG__decode_o1}

\begin{CompactList}\small\item\em Pointer to request info list. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Structure used to hold information used in decoding the response to register read operations. 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{LCFG__p_8h}{LCFG\_\-p.h}\end{CompactItemize}
