\hypertarget{structFldDescription}{
\section{Fld\-Description Struct Reference}
\label{structFldDescription}\index{FldDescription@{FldDescription}}
}
Parameters necessary to describe a field within a register.  


{\tt \#include $<$descriptions\_\-p.h$>$}

\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hypertarget{structFldDescription_o0}{
unsigned \hyperlink{structFldDescription_o0}{width}}
\label{structFldDescription_o0}

\begin{CompactList}\small\item\em width of the field \item\end{CompactList}\item 
\hypertarget{structFldDescription_o1}{
unsigned \hyperlink{structFldDescription_o1}{offset}}
\label{structFldDescription_o1}

\begin{CompactList}\small\item\em offset within the register \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Parameters necessary to describe a field within a register. 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{descriptions__p_8h}{descriptions\_\-p.h}\end{CompactItemize}
