\hypertarget{structFldDescription}{
\section{FldDescription Struct Reference}
\label{structFldDescription}\index{FldDescription@{FldDescription}}
}
Parameters necessary to describe a field within a register.  


{\tt \#include $<$descriptions\_\-p.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hypertarget{structFldDescription_0b6cd63c337bf20cb320fdf72af1490a}{
unsigned \hyperlink{structFldDescription_0b6cd63c337bf20cb320fdf72af1490a}{width}}
\label{structFldDescription_0b6cd63c337bf20cb320fdf72af1490a}

\begin{CompactList}\small\item\em width of the field \item\end{CompactList}\item 
\hypertarget{structFldDescription_2e2ffe587ab0d0462c6d6b2cff840003}{
unsigned \hyperlink{structFldDescription_2e2ffe587ab0d0462c6d6b2cff840003}{offset}}
\label{structFldDescription_2e2ffe587ab0d0462c6d6b2cff840003}

\begin{CompactList}\small\item\em offset within the register \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Parameters necessary to describe a field within a register. 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{descriptions__p_8h}{descriptions\_\-p.h}\end{CompactItemize}
