\hypertarget{struct__WCB}{
\section{\_\-WCB Struct Reference}
\label{struct__WCB}\index{\_\-WCB@{\_\-WCB}}
}
WakeUp Control Block.  


\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hyperlink{struct__WCB__common}{WCB\_\-common} \hyperlink{struct__WCB_e55518f55f20234df404a07a315442d2}{com}
\item 
\hyperlink{struct__WCB__specific}{WCB\_\-specific} \hyperlink{struct__WCB_8b89dc06c137821c73c65426c0613246}{spc}
\end{CompactItemize}


\subsection{Detailed Description}
WakeUp Control Block. 

\subsection{Member Data Documentation}
\hypertarget{struct__WCB_e55518f55f20234df404a07a315442d2}{
\index{\_\-WCB@{\_\-WCB}!com@{com}}
\index{com@{com}!_WCB@{\_\-WCB}}
\subsubsection[{com}]{\setlength{\rightskip}{0pt plus 5cm}{\bf WCB\_\-common} {\bf \_\-WCB::com}}}
\label{struct__WCB_e55518f55f20234df404a07a315442d2}


Implementation common component 

Referenced by add\_\-wut(), WUT\_\-cancel(), WUT\_\-create(), WUT\_\-destroy(), WUT\_\-sys\_\-adjust(), WUT\_\-sys\_\-connect(), WUT\_\-sys\_\-handler(), WUT\_\-sys\_\-init(), WUT\_\-sys\_\-reset(), and WUT\_\-sys\_\-shutdown().\hypertarget{struct__WCB_8b89dc06c137821c73c65426c0613246}{
\index{\_\-WCB@{\_\-WCB}!spc@{spc}}
\index{spc@{spc}!_WCB@{\_\-WCB}}
\subsubsection[{spc}]{\setlength{\rightskip}{0pt plus 5cm}{\bf WCB\_\-specific} {\bf \_\-WCB::spc}}}
\label{struct__WCB_8b89dc06c137821c73c65426c0613246}


Implementation specific component 

Referenced by wut\_\-sys\_\-connect(), WUT\_\-sys\_\-handler(), and wut\_\-sys\_\-shutdown().

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{WUT_8c_8vx-xxx-xxx}{WUT.c.vx-xxx-xxx}\end{CompactItemize}
