\hypertarget{TOV_8c}{
\section{TOV.c File Reference}
\label{TOV_8c}\index{TOV.c@{TOV.c}}
}
Timeout service routines.  


{\tt \#include $<$IPBS/TOV.h$>$}\par


\subsection{Detailed Description}
Timeout service routines. 

\begin{Desc}
\item[Author:]JJRussell - \href{mailto:russell@slac.stanford.edu}{\tt russell@slac.stanford.edu}\end{Desc}


\footnotesize\begin{verbatim}

    CVS $Id: TOV.c,v 1.2 2011/03/25 21:14:42 saxton Exp $
\end{verbatim}
\normalsize


Provides a set of utility functions to define a timeout time. The timeout is always given in terms of absolute time, but the exact specification is platform dependent. This file just vectors to the correct implementation dependent file. 