\hypertarget{TAU_8c}{
\section{TAU.c File Reference}
\label{TAU_8c}\index{TAU.c@{TAU.c}}
}
Thermal Assist Unit, dummy implementation.  


{\tt \#include $<$IPBS/TAU.h$>$}\par
{\tt \#include $<$impl/TAU.c.xx-xxx-xxx$>$}\par


\subsection{Detailed Description}
Thermal Assist Unit, dummy implementation. 

\begin{Desc}
\item[Author:]JJRussell - \href{mailto:russell@slac.stanford.edu}{\tt russell@slac.stanford.edu}\end{Desc}


\footnotesize\begin{verbatim}
    CVS $Id: TAU.c,v 1.2 2011/03/25 21:14:42 saxton Exp $
\end{verbatim}
\normalsize


The TAU facility is supported only on PPC750 platforms. A baredones dummy implementation is provided on non-PPC750 platforms. This file merely includes the correct implementation. 