\hypertarget{struct__WCB}{
\section{\_\-WCB Struct Reference}
\label{struct__WCB}\index{_WCB@{\_\-WCB}}
}
Wake\-Up Control Block.  


Collaboration diagram for \_\-WCB:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=243pt]{struct__WCB__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hyperlink{struct__WCB__common}{WCB\_\-common} \hyperlink{struct__WCB_o0}{com}
\item 
\hyperlink{struct__WCB__specific}{WCB\_\-specific} \hyperlink{struct__WCB_o1}{spc}
\end{CompactItemize}


\subsection{Detailed Description}
Wake\-Up Control Block. 



\subsection{Field Documentation}
\hypertarget{struct__WCB_o0}{
\index{_WCB@{\_\-WCB}!com@{com}}
\index{com@{com}!_WCB@{\_\-WCB}}
\subsubsection[com]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__WCB__common}{WCB\_\-common} \hyperlink{struct__WCB_o0}{\_\-WCB::com}}}
\label{struct__WCB_o0}


Implementation common component \hypertarget{struct__WCB_o1}{
\index{_WCB@{\_\-WCB}!spc@{spc}}
\index{spc@{spc}!_WCB@{\_\-WCB}}
\subsubsection[spc]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__WCB__specific}{WCB\_\-specific} \hyperlink{struct__WCB_o1}{\_\-WCB::spc}}}
\label{struct__WCB_o1}


Implementation specific component 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{WUT_8c_8vx-xxx-xxx}{WUT.c.vx-xxx-xxx}\end{CompactItemize}
