\hypertarget{TOC_8c}{
\section{TOC.c File Reference}
\label{TOC_8c}\index{TOC.c@{TOC.c}}
}
Time\-Out control implementation file, callable version. 

{\tt \#include \char`\"{}IPBS/TOC.h\char`\"{}}\par


Include dependency graph for TOC.c:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=298pt]{TOC_8c__incl}
\end{center}
\end{figure}


\subsection{Detailed Description}
Time\-Out control implementation file, callable version. 

\begin{Desc}
\item[Author:]JJRussell - \href{mailto:russell@slac.stanford.edu}{\tt russell@slac.stanford.edu}\end{Desc}


\footnotesize\begin{verbatim}    CVS $Id: TOC.c,v 1.1.1.1 2006/02/10 21:45:34 saxton Exp $
\end{verbatim}
\normalsize


\begin{Desc}
\item[SYNOPSIS]Provides a set of utility functions to manipulate a timeout control structure. The timeout control structure is passed to most all routines that requirement implement a timeout. It serves as a universal method to convert a variety of time representations to a Time\-Out Value, TOV.\end{Desc}
