\hypertarget{REG_8h}{
\section{REG.h File Reference}
\label{REG_8h}\index{REG.h@{REG.h}}
}
Fetches the value of the specialized registers, interface. 

{\tt \#include \char`\"{}IPBS/impl/REG.h.xx-xxx-xxx\char`\"{}}\par


Include dependency graph for REG.h:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=145pt]{REG_8h__incl}
\end{center}
\end{figure}


This graph shows which files directly or indirectly include this file:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=85pt]{REG_8h__dep__incl}
\end{center}
\end{figure}


\subsection{Detailed Description}
Fetches the value of the specialized registers, interface. 

\begin{Desc}
\item[Author:]JJRussell - \href{mailto:russell@slac.stanford.edu}{\tt russell@slac.stanford.edu}\end{Desc}


\footnotesize\begin{verbatim}    CVS $Id: REG.h,v 1.1.1.1 2006/02/10 21:45:36 saxton Exp $
\end{verbatim}
\normalsize


\begin{Desc}
\item[SYNOPSIS]This provides a macro to fetch to value of the current PC counter and STACK POINTER. The primary use is reporting for bug checks and the like, {\em i.e\/}. read only use. The implementation by as a C macros.\end{Desc}
