\section{File List}
Here is a list of all documented files with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{EMSG__control_8c}{EMSG\_\-control.c} (Routines to handle all control aspects of the message system )}{\pageref{EMSG__control_8c}}{}
\item\contentsline{section}{\hyperlink{EMSG__database_8c}{EMSG\_\-database.c} (Provides the facilities to maintain the error message database )}{\pageref{EMSG__database_8c}}{}
\item\contentsline{section}{\hyperlink{EMSG__database_8h}{EMSG\_\-database.h} (Message database definitions )}{\pageref{EMSG__database_8h}}{}
\item\contentsline{section}{\hyperlink{EMSG__msgs_8c}{EMSG\_\-msgs.c} (Constructor/destructor routines for message facility EMSG (ID: 254, 0xfe) )}{\pageref{EMSG__msgs_8c}}{}
\item\contentsline{section}{\hyperlink{EMSG__msgs_8h}{EMSG\_\-msgs.h} (Message definitions for message facility EMSG (ID: 254, 0xfe) )}{\pageref{EMSG__msgs_8h}}{}
\item\contentsline{section}{\hyperlink{EMSG__output_8c}{EMSG\_\-output.c} (Routines to output processors and output processing )}{\pageref{EMSG__output_8c}}{}
\item\contentsline{section}{\hyperlink{EMSG__printProc_8c}{EMSG\_\-printProc.c} (A message output processor )}{\pageref{EMSG__printProc_8c}}{}
\item\contentsline{section}{\hyperlink{EMSG__prvdefs_8h}{EMSG\_\-prvdefs.h} (Private definitions for the EMSG facility )}{\pageref{EMSG__prvdefs_8h}}{}
\item\contentsline{section}{\hyperlink{EMSG__pubdefs_8h}{EMSG\_\-pubdefs.h} (Public include file defining the interface to the EMSG facility )}{\pageref{EMSG__pubdefs_8h}}{}
\item\contentsline{section}{\hyperlink{EMSG__report_8c}{EMSG\_\-report.c} (Core run time routines for the message facility )}{\pageref{EMSG__report_8c}}{}
\item\contentsline{section}{\hyperlink{EMSG__report__mt_8c}{EMSG\_\-report\_\-mt.c} (Multi-threaded specific implementations of utility routines )}{\pageref{EMSG__report__mt_8c}}{}
\end{CompactList}
