\section{Class List}
Here are the classes, structs, unions and interfaces with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{struct__EMSG__AltMessage}{\_\-EMSG\_\-AltMessage} (Alternative message table (used to improve internal efficiency) )}{\pageref{struct__EMSG__AltMessage}}{}
\item\contentsline{section}{\hyperlink{struct__EMSG__Control}{\_\-EMSG\_\-Control} (Structure to hold the message control block )}{\pageref{struct__EMSG__Control}}{}
\item\contentsline{section}{\hyperlink{struct__EMSG__Counts}{\_\-EMSG\_\-Counts} (Structure for instrumentation counts )}{\pageref{struct__EMSG__Counts}}{}
\item\contentsline{section}{\hyperlink{struct__EMSG__FacList}{\_\-EMSG\_\-FacList} (List of facilities used at run time )}{\pageref{struct__EMSG__FacList}}{}
\item\contentsline{section}{\hyperlink{struct__EMSG__InitPrm}{\_\-EMSG\_\-InitPrm} (Structure to hold parameters needed by EMSG initialization routine )}{\pageref{struct__EMSG__InitPrm}}{}
\item\contentsline{section}{\hyperlink{struct__EMSG__Message}{\_\-EMSG\_\-Message} (Structure to hold an instance of a message )}{\pageref{struct__EMSG__Message}}{}
\item\contentsline{section}{\hyperlink{struct__EMSG__MsgList}{\_\-EMSG\_\-MsgList} (List of messages used at run time )}{\pageref{struct__EMSG__MsgList}}{}
\item\contentsline{section}{\hyperlink{struct__EMSG__OutputRtn}{\_\-EMSG\_\-OutputRtn} (Structure to hold an output processor (on a singly linked list) )}{\pageref{struct__EMSG__OutputRtn}}{}
\item\contentsline{section}{\hyperlink{struct__EMSG__Packet}{\_\-EMSG\_\-Packet} (Structure to hold a complete message description packet )}{\pageref{struct__EMSG__Packet}}{}
\end{CompactList}
