\hypertarget{LCBD_8h}{
\section{LCBD.h File Reference}
\label{LCBD_8h}\index{LCBD.h@{LCBD.h}}
}
One-size-fits-all include file for the LCBD driver. This file is strictly for user convenience.  


{\tt \#include $<$LCBD/LCBD\_\-drv.h$>$}\par
{\tt \#include $<$LCBD/LCBD\_\-clk.h$>$}\par
{\tt \#include $<$LCBD/LCBD\_\-evt.h$>$}\par
{\tt \#include $<$LCBD/LCBD\_\-nut.h$>$}\par
{\tt \#include $<$LCBD/LCBD\_\-rst.h$>$}\par
{\tt \#include $<$LCBD/LCBD\_\-stats.h$>$}\par
{\tt \#include $<$LCBD/LCBD\_\-cr.h$>$}\par
{\tt \#include $<$LCBD/LCBC.h$>$}\par
{\tt \#include $<$LCBD/LCBR.h$>$}\par
{\tt \#include $<$LCBD/LCBD\_\-msgs.h$>$}\par
{\tt \#include $<$LCBD/LATP.h$>$}\par
{\tt \#include $<$LCBD/LCB.h$>$}\par
{\tt \#include $<$LCBD/LCB\_\-cr.h$>$}\par


\subsection{Detailed Description}
One-size-fits-all include file for the LCBD driver. This file is strictly for user convenience. 

\begin{Desc}
\item[Author:]JJRussell -- \href{mailto:russell@slac.stanford.edu}{\tt russell@slac.stanford.edu}\end{Desc}


\footnotesize\begin{verbatim}
  CVS $Id
\end{verbatim}
\normalsize


\begin{Desc}
\item[What's in this File?]The short answer is, everything, It contains all of the definitions and prototypes needed to use the LCBD driver. This is a composite of all the sub-include files. Users are encouraged to use the finer-grain files where appropriate, but for those just wishing to get on with things, this file includes everything. Of course, the cost is exposure to a lot of unnecessary detail.\end{Desc}
\begin{Desc}
\item[Warning:]The only file missing is \hyperlink{LCBD__pci_8h}{LCBD\_\-pci.h}. This is really just for testing, developing or debugging. \end{Desc}
