\hypertarget{struct__LCBD}{
\section{\_\-LCBD Struct Reference}
\label{struct__LCBD}\index{_LCBD@{\_\-LCBD}}
}
Struct containing fundamental parameters for the LCB.  


{\tt \#include $<$LCBD\_\-p.h$>$}

Collaboration diagram for \_\-LCBD:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=327pt]{struct__LCBD__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
volatile \hyperlink{union__LCBD__siv}{LCBD\_\-siv} \hyperlink{struct__LCBD_o0}{m\_\-siv}
\item 
\hyperlink{struct__LCBD__icb}{LCBD\_\-icb} \hyperlink{struct__LCBD_o1}{m\_\-icb}
\item 
\hyperlink{struct__LCBD__dib}{LCBD\_\-dib} \hyperlink{struct__LCBD_o2}{m\_\-dib}
\item 
\hyperlink{struct__LCBD__aib}{LCBD\_\-aib} \hyperlink{struct__LCBD_o3}{m\_\-aib}
\item 
\hyperlink{struct__LCBD__ucb}{LCBD\_\-ucb} \hyperlink{struct__LCBD_o4}{m\_\-ucb}
\item 
\hyperlink{struct__LCBD__ncb}{LCBD\_\-ncb} \hyperlink{struct__LCBD_o5}{m\_\-ncb}
\item 
\hyperlink{struct__LCBD__scb}{LCBD\_\-scb} \hyperlink{struct__LCBD_o6}{m\_\-scb}
\end{CompactItemize}


\subsection{Detailed Description}
Struct containing fundamental parameters for the LCB. 



\subsection{Field Documentation}
\hypertarget{struct__LCBD_o3}{
\index{_LCBD@{\_\-LCBD}!m_aib@{m\_\-aib}}
\index{m_aib@{m\_\-aib}!_LCBD@{\_\-LCBD}}
\subsubsection[m\_\-aib]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__LCBD__aib}{LCBD\_\-aib} \hyperlink{struct__LCBD_o3}{\_\-LCBD::m\_\-aib}}}
\label{struct__LCBD_o3}


Asynchronous Initialization Block \hypertarget{struct__LCBD_o2}{
\index{_LCBD@{\_\-LCBD}!m_dib@{m\_\-dib}}
\index{m_dib@{m\_\-dib}!_LCBD@{\_\-LCBD}}
\subsubsection[m\_\-dib]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__LCBD__dib}{LCBD\_\-dib} \hyperlink{struct__LCBD_o2}{\_\-LCBD::m\_\-dib}}}
\label{struct__LCBD_o2}


Device Information Block \hypertarget{struct__LCBD_o1}{
\index{_LCBD@{\_\-LCBD}!m_icb@{m\_\-icb}}
\index{m_icb@{m\_\-icb}!_LCBD@{\_\-LCBD}}
\subsubsection[m\_\-icb]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__LCBD__icb}{LCBD\_\-icb} \hyperlink{struct__LCBD_o1}{\_\-LCBD::m\_\-icb}}}
\label{struct__LCBD_o1}


The interrupt connection block \hypertarget{struct__LCBD_o5}{
\index{_LCBD@{\_\-LCBD}!m_ncb@{m\_\-ncb}}
\index{m_ncb@{m\_\-ncb}!_LCBD@{\_\-LCBD}}
\subsubsection[m\_\-ncb]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__LCBD__ncb}{LCBD\_\-ncb} \hyperlink{struct__LCBD_o5}{\_\-LCBD::m\_\-ncb}}}
\label{struct__LCBD_o5}


Notification control Block \hypertarget{struct__LCBD_o6}{
\index{_LCBD@{\_\-LCBD}!m_scb@{m\_\-scb}}
\index{m_scb@{m\_\-scb}!_LCBD@{\_\-LCBD}}
\subsubsection[m\_\-scb]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__LCBD__scb}{LCBD\_\-scb} \hyperlink{struct__LCBD_o6}{\_\-LCBD::m\_\-scb}}}
\label{struct__LCBD_o6}


Statistics Control Block \hypertarget{struct__LCBD_o0}{
\index{_LCBD@{\_\-LCBD}!m_siv@{m\_\-siv}}
\index{m_siv@{m\_\-siv}!_LCBD@{\_\-LCBD}}
\subsubsection[m\_\-siv]{\setlength{\rightskip}{0pt plus 5cm}volatile \hyperlink{union__LCBD__siv}{LCBD\_\-siv} \hyperlink{struct__LCBD_o0}{\_\-LCBD::m\_\-siv}}}
\label{struct__LCBD_o0}


State Information Vector \hypertarget{struct__LCBD_o4}{
\index{_LCBD@{\_\-LCBD}!m_ucb@{m\_\-ucb}}
\index{m_ucb@{m\_\-ucb}!_LCBD@{\_\-LCBD}}
\subsubsection[m\_\-ucb]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__LCBD__ucb}{LCBD\_\-ucb} \hyperlink{struct__LCBD_o4}{\_\-LCBD::m\_\-ucb}}}
\label{struct__LCBD_o4}


Unit control blocks 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{LCBD__p_8h}{LCBD\_\-p.h}\end{CompactItemize}
