\documentclass[letterpaper]{book}
\usepackage{makeidx}
\usepackage{fancyhdr}
\usepackage{graphicx}
\usepackage{multicol}
\usepackage{float}
\usepackage{textcomp}
\usepackage{alltt}
\usepackage{times}
\ifx\pdfoutput\undefined
\usepackage[ps2pdf,
            pagebackref=true,
            colorlinks=true,
            linkcolor=blue
           ]{hyperref}
\usepackage{pspicture}
\else
\usepackage[pdftex,
            pagebackref=true,
            colorlinks=true,
            linkcolor=blue
           ]{hyperref}
\fi
\usepackage{doxygen}
\makeindex
\setcounter{tocdepth}{1}
\renewcommand{\footrulewidth}{0.4pt}
\begin{document}
\begin{titlepage}
\vspace*{7cm}
\begin{center}
{\Large Reference Manual}\\
\vspace*{1cm}
{\large Generated by Doxygen 1.3.3}\\
\vspace*{0.5cm}
{\small Sat Oct 30 07:26:49 2004}\\
\end{center}
\end{titlepage}
\clearemptydoublepage
\pagenumbering{roman}
\tableofcontents
\clearemptydoublepage
\pagenumbering{arabic}
\chapter{CMX Generated Documentation }
\label{index}\hypertarget{index}{}\input{index}
\chapter{File Index}
\input{files}
\chapter{File Documentation}
\input{LCB__bulk__def_8h}
\include{LCB__io__proto_8h}
\include{LCB__pci__proto_8h}
\include{LIOX__sync__handle_8h}
\include{t__header__LCB_8c}
\include{t__header__LCB__bulk_8c}
\include{t__header__LCB__dispatch_8c}
\include{t__header__LCB__err_8c}
\include{t__header__LCB__init_8c}
\include{t__header__LCB__io_8c}
\include{t__header__LCB__latp_8c}
\include{t__header__LCB__log_8c}
\include{t__header__LCB__msgs_8c}
\include{t__header__LCB__pci_8c}
\include{t__header__LCB__poll_8c}
\include{t__header__LCB__reg_8c}
\include{t__header__LCB__stats_8c}
\include{t__header__LIOX_8c}
\include{t__header__LIOX__addr_8c}
\include{t__header__LIOX__addr__def_8c}
\include{t__header__LIOX__cmd_8c}
\include{t__header__LIOX__init_8c}
\include{t__header__LIOX__msgs_8c}
\include{t__header__LIOX__pool_8c}
\include{t__header__LIOX__pool__def_8c}
\include{t__header__LIOX__rst_8c}
\include{t__header__LIOX__sync_8c}
\include{t__header__LIOX__sys_8c}
\include{t__header__LIOX__util_8c}
\printindex
\end{document}
