\section{Data Structures}
Here are the data structures with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{struct__BFevCAL__LogAccepts}{\_\-BFev\-CAL\_\-Log\-Accepts} (Map of 32-bit calorimeter log accepts word)}{\pageref{struct__BFevCAL__LogAccepts}}{}
\item\contentsline{section}{\hyperlink{struct__BFevCAL__LogData}{\_\-BFev\-CAL\_\-Log\-Data} (Map of 32-bit calorimeter log data word)}{\pageref{struct__BFevCAL__LogData}}{}
\item\contentsline{section}{\hyperlink{struct__BFevDiag__CalLayerEnd}{\_\-BFev\-Diag\_\-Cal\-Layer\-End} (Map of 16 bit calorimeter layer-end diagnostic data)}{\pageref{struct__BFevDiag__CalLayerEnd}}{}
\item\contentsline{section}{\hyperlink{struct__BFevErr__CablePhase}{\_\-BFev\-Err\_\-Cable\-Phase} (Map of 16-bit cable phasing error word)}{\pageref{struct__BFevErr__CablePhase}}{}
\item\contentsline{section}{\hyperlink{struct__BFevErr__CableTimeOut}{\_\-BFev\-Err\_\-Cable\-Time\-Out} (Map of 16-bit cable timeout error word)}{\pageref{struct__BFevErr__CableTimeOut}}{}
\item\contentsline{section}{\hyperlink{struct__BFevErr__GCCC}{\_\-BFev\-Err\_\-GCCC} (Map of 16-bit GCCC error word)}{\pageref{struct__BFevErr__GCCC}}{}
\item\contentsline{section}{\hyperlink{struct__BFevErr__GTCC}{\_\-BFev\-Err\_\-GTCC} (Map of 16-bit GTCC error word)}{\pageref{struct__BFevErr__GTCC}}{}
\item\contentsline{section}{\hyperlink{struct__BFevErr__Summary}{\_\-BFev\-Err\_\-Summary} (Map of 16-bit error summary word)}{\pageref{struct__BFevErr__Summary}}{}
\item\contentsline{section}{\hyperlink{struct__BFevSummary}{\_\-BFev\-Summary} (Map of 32-bit event summary word)}{\pageref{struct__BFevSummary}}{}
\item\contentsline{section}{\hyperlink{struct__BFevTKR__Accepts}{\_\-BFev\-TKR\_\-Accepts} (Map of 72 bit tracker accepts data)}{\pageref{struct__BFevTKR__Accepts}}{}
\item\contentsline{section}{\hyperlink{union__evCAL__LogAccepts}{\_\-ev\-CAL\_\-Log\-Accepts} (Union for 32-bit calorimeter log accepts word)}{\pageref{union__evCAL__LogAccepts}}{}
\item\contentsline{section}{\hyperlink{union__evCAL__LogData}{\_\-ev\-CAL\_\-Log\-Data} (Union for 32-bit calorimeter log data word)}{\pageref{union__evCAL__LogData}}{}
\item\contentsline{section}{\hyperlink{struct__evDiag__CalLayer}{\_\-ev\-Diag\_\-Cal\-Layer} (Map of 32-bit Calorimeter layer diagnostic data)}{\pageref{struct__evDiag__CalLayer}}{}
\item\contentsline{section}{\hyperlink{union__evDiag__CalLayerEnd}{\_\-ev\-Diag\_\-Cal\-Layer\-End} (Union for 16-bit struct \hyperlink{struct__BFevDiag__CalLayerEnd}{\_\-BFev\-Diag\_\-Cal\-Layer\-End})}{\pageref{union__evDiag__CalLayerEnd}}{}
\item\contentsline{section}{\hyperlink{struct__evDiag__Data}{\_\-ev\-Diag\_\-Data} (Map of TEM event diagnostic contribution)}{\pageref{struct__evDiag__Data}}{}
\item\contentsline{section}{\hyperlink{struct__evDiag__TkrTrgReq}{\_\-ev\-Diag\_\-Tkr\-Trg\-Req} (Map of 16 bit calorimeter layer-end diagnostic data)}{\pageref{struct__evDiag__TkrTrgReq}}{}
\item\contentsline{section}{\hyperlink{union__evErr__CablePhase}{\_\-ev\-Err\_\-Cable\-Phase} (Union for 16-bit cable phasing error word)}{\pageref{union__evErr__CablePhase}}{}
\item\contentsline{section}{\hyperlink{union__evErr__CableTimeOut}{\_\-ev\-Err\_\-Cable\-Time\-Out} (Union for 16-bit cable timeout error word)}{\pageref{union__evErr__CableTimeOut}}{}
\item\contentsline{section}{\hyperlink{union__evErr__GCCC}{\_\-ev\-Err\_\-GCCC} (Union for 16-bit GCCC error word)}{\pageref{union__evErr__GCCC}}{}
\item\contentsline{section}{\hyperlink{union__evErr__GTCC}{\_\-ev\-Err\_\-GTCC} (Union for 16-bit GTCC error word)}{\pageref{union__evErr__GTCC}}{}
\item\contentsline{section}{\hyperlink{union__evErr__Summary}{\_\-ev\-Err\_\-Summary} (Union for 16-bit error summary word)}{\pageref{union__evErr__Summary}}{}
\item\contentsline{section}{\hyperlink{union__evSummary}{\_\-ev\-Summary} (Union for 32-bit event summary word)}{\pageref{union__evSummary}}{}
\item\contentsline{section}{\hyperlink{union__evTKR__Accepts}{\_\-ev\-TKR\_\-Accepts} (Union for 128-bit TKR Accepts structure)}{\pageref{union__evTKR__Accepts}}{}
\item\contentsline{section}{\hyperlink{struct__evTKR__Strips}{\_\-ev\-TKR\_\-Strips} (Map of tracker strip data)}{\pageref{struct__evTKR__Strips}}{}
\end{CompactList}
