\hypertarget{structLCB__pci}{
\section{LCB\_\-pci Struct Reference}
\label{structLCB__pci}\index{LCB_pci@{LCB\_\-pci}}
}
A configuration parameters for the PCI register.  


{\tt \#include $<$LCB\_\-cfg\_\-p.h$>$}



\subsection{Detailed Description}
A configuration parameters for the PCI register. 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{LCB__cfg__p_8h}{LCB\_\-cfg\_\-p.h}\end{CompactItemize}
