\section{Data Structures}
Here are the data structures with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{struct__TCU__DefaultHard}{\_\-TCU\_\-Default\-Hard} (Hardware default settings for FE and RC chips)}{\pageref{struct__TCU__DefaultHard}}{}
\item\contentsline{section}{\hyperlink{struct__TCU__DefaultSoft}{\_\-TCU\_\-Default\-Soft} (Software default settings for FE/RC chips and some FPGA registers)}{\pageref{struct__TCU__DefaultSoft}}{}
\item\contentsline{section}{\hyperlink{struct__TCU__FE__Chip}{\_\-TCU\_\-FE\_\-Chip} (Model of FE chip registers (28 bytes))}{\pageref{struct__TCU__FE__Chip}}{}
\item\contentsline{section}{\hyperlink{struct__TCU__Fpga__L1t}{\_\-TCU\_\-Fpga\_\-L1t} (Cache of a subset of the L1T FPGA registers (60 bytes))}{\pageref{struct__TCU__Fpga__L1t}}{}
\item\contentsline{section}{\hyperlink{struct__TCU__Fpga__Tkr}{\_\-TCU\_\-Fpga\_\-Tkr} (Cache of a subset of the TKR FPGA registers (24 bytes))}{\pageref{struct__TCU__Fpga__Tkr}}{}
\item\contentsline{section}{\hyperlink{struct__TCU__Instrument}{\_\-TCU\_\-Instrument} (Model of the complete instrument)}{\pageref{struct__TCU__Instrument}}{}
\item\contentsline{section}{\hyperlink{struct__TCU__Map}{\_\-TCU\_\-Map} (A single plane as described by the conversion map)}{\pageref{struct__TCU__Map}}{}
\item\contentsline{section}{\hyperlink{struct__TCU__Plane}{\_\-TCU\_\-Plane} (Model of a single TKR plane)}{\pageref{struct__TCU__Plane}}{}
\item\contentsline{section}{\hyperlink{struct__TCU__RC__Chip}{\_\-TCU\_\-RC\_\-Chip} (Model of RC chip registers (4 bytes))}{\pageref{struct__TCU__RC__Chip}}{}
\item\contentsline{section}{\hyperlink{struct__TCU__Tower}{\_\-TCU\_\-Tower} (Model of a single TKR tower)}{\pageref{struct__TCU__Tower}}{}
\end{CompactList}
