\hypertarget{structLTC__HpConfigRec}{
\section{LTC\_\-HpConfigRec Struct Reference}
\label{structLTC__HpConfigRec}\index{LTC\_\-HpConfigRec@{LTC\_\-HpConfigRec}}
}
Configuration data for a single heat pipe.  


{\tt \#include $<$ltcPrivate.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hyperlink{structLTC__Options}{LTC\_\-Options} \hyperlink{structLTC__HpConfigRec_25b92ab952a1ad9a1b7d1b3d7cf2fc92}{opts}
\item 
\hyperlink{ltcPrivate_8h_a3690bf50fca7d73ce04bff7c2613acb}{LTC\_\-CntrlParams} \hyperlink{structLTC__HpConfigRec_51bef3b6d6a981b6cfb586624c0af898}{param}
\end{CompactItemize}


\subsection{Detailed Description}
Configuration data for a single heat pipe. 

\subsection{Member Data Documentation}
\hypertarget{structLTC__HpConfigRec_25b92ab952a1ad9a1b7d1b3d7cf2fc92}{
\index{LTC\_\-HpConfigRec@{LTC\_\-HpConfigRec}!opts@{opts}}
\index{opts@{opts}!LTC_HpConfigRec@{LTC\_\-HpConfigRec}}
\subsubsection[{opts}]{\setlength{\rightskip}{0pt plus 5cm}{\bf LTC\_\-Options} {\bf LTC\_\-HpConfigRec::opts}}}
\label{structLTC__HpConfigRec_25b92ab952a1ad9a1b7d1b3d7cf2fc92}


Option selections 

Referenced by LTC\_\-RdHpConfigFile().\hypertarget{structLTC__HpConfigRec_51bef3b6d6a981b6cfb586624c0af898}{
\index{LTC\_\-HpConfigRec@{LTC\_\-HpConfigRec}!param@{param}}
\index{param@{param}!LTC_HpConfigRec@{LTC\_\-HpConfigRec}}
\subsubsection[{param}]{\setlength{\rightskip}{0pt plus 5cm}{\bf LTC\_\-CntrlParams} {\bf LTC\_\-HpConfigRec::param}}}
\label{structLTC__HpConfigRec_51bef3b6d6a981b6cfb586624c0af898}


Control algorithm params per heat pipe 

Referenced by LTC\_\-RdHpConfigFile().

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{ltcPrivate_8h}{ltcPrivate.h}\end{CompactItemize}
