\hypertarget{structLTC__FltDf}{
\section{LTC\_\-FltDf Struct Reference}
\label{structLTC__FltDf}\index{LTC\_\-FltDf@{LTC\_\-FltDf}}
}
Data defining temperature smoothing filter.  


{\tt \#include $<$ltcPrivate.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
int \hyperlink{structLTC__FltDf_29223f488276b21c20a523a84f70454b}{fln}
\item 
signed int \hyperlink{structLTC__FltDf_de75f2f38a2481928d5e41d8ae8f0746}{cf} \mbox{[}LTC\_\-MAX\_\-FLT\_\-SZ\mbox{]}
\end{CompactItemize}


\subsection{Detailed Description}
Data defining temperature smoothing filter. 

\subsection{Member Data Documentation}
\hypertarget{structLTC__FltDf_de75f2f38a2481928d5e41d8ae8f0746}{
\index{LTC\_\-FltDf@{LTC\_\-FltDf}!cf@{cf}}
\index{cf@{cf}!LTC_FltDf@{LTC\_\-FltDf}}
\subsubsection[{cf}]{\setlength{\rightskip}{0pt plus 5cm}signed int {\bf LTC\_\-FltDf::cf}\mbox{[}LTC\_\-MAX\_\-FLT\_\-SZ\mbox{]}}}
\label{structLTC__FltDf_de75f2f38a2481928d5e41d8ae8f0746}


coeff array (variable size) 

Referenced by LTC\_\-Smooth().\hypertarget{structLTC__FltDf_29223f488276b21c20a523a84f70454b}{
\index{LTC\_\-FltDf@{LTC\_\-FltDf}!fln@{fln}}
\index{fln@{fln}!LTC_FltDf@{LTC\_\-FltDf}}
\subsubsection[{fln}]{\setlength{\rightskip}{0pt plus 5cm}int {\bf LTC\_\-FltDf::fln}}}
\label{structLTC__FltDf_29223f488276b21c20a523a84f70454b}


length in terms of back values 

Referenced by LTC\_\-CnvAdcToTmp(), LTC\_\-InitSmooth(), LTC\_\-IsGoodTemps(), LTC\_\-RdFilterDefFile(), and LTC\_\-Smooth().

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{ltcPrivate_8h}{ltcPrivate.h}\end{CompactItemize}
