\section{Data Structures}
Here are the data structures with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{struct__ITC__QueueItem}{\_\-ITC\_\-Queue\-Item} (Forward reference for struct \_\-ITC\_\-Queue\-Item )}{\pageref{struct__ITC__QueueItem}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__cl}{\_\-LTC\_\-cl} (Command list to read PDU env register )}{\pageref{struct__LTC__cl}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__DiagLTC__Tlm}{\_\-LTC\_\-Diag\-LTC\_\-Tlm} (LAT Thermal Control diagnostic telemetry $\backslash$ APID 0x2bc )}{\pageref{struct__LTC__DiagLTC__Tlm}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__HtrOnOffCtl__Pkt}{\_\-LTC\_\-Htr\-On\-Off\-Ctl\_\-Pkt} (Set heater to always on, or off or automatic control. $\backslash$ APID 0x645 $\backslash$ function code 5 )}{\pageref{struct__LTC__HtrOnOffCtl__Pkt}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__HtrOnOffCtl__Prm}{\_\-LTC\_\-Htr\-On\-Off\-Ctl\_\-Prm} (Set heater to always on, or off or automatic control. $\backslash$ APID 0x645 $\backslash$ function code 5 )}{\pageref{struct__LTC__HtrOnOffCtl__Prm}}{}
\item\contentsline{section}{\hyperlink{union__LTC__ResRitSnsrSel}{\_\-LTC\_\-Res\-Rit\-Snsr\-Sel} (Union for telemetry bitfield \hyperlink{struct__LTC__ResRitSnsrSel__Bfl}{\_\-LTC\_\-Res\-Rit\-Snsr\-Sel\_\-Bfl} )}{\pageref{union__LTC__ResRitSnsrSel}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__ResRitSnsrSel__Bfl}{\_\-LTC\_\-Res\-Rit\-Snsr\-Sel\_\-Bfl} (Selected RSVR and RIT sensors )}{\pageref{struct__LTC__ResRitSnsrSel__Bfl}}{}
\item\contentsline{section}{\hyperlink{union__LTC__ResRitStatus}{\_\-LTC\_\-Res\-Rit\-Status} (Union for telemetry bitfield \hyperlink{struct__LTC__ResRitStatus__Bfl}{\_\-LTC\_\-Res\-Rit\-Status\_\-Bfl} )}{\pageref{union__LTC__ResRitStatus}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__ResRitStatus__Bfl}{\_\-LTC\_\-Res\-Rit\-Status\_\-Bfl} (Heat pipe RIT and reservoir sensors status )}{\pageref{struct__LTC__ResRitStatus__Bfl}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__ReStart__Pkt}{\_\-LTC\_\-Re\-Start\_\-Pkt} (Restart and initialize Thermal Control $\backslash$ APID 0x645 $\backslash$ function code 1 )}{\pageref{struct__LTC__ReStart__Pkt}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__ReStart__Prm}{\_\-LTC\_\-Re\-Start\_\-Prm} (Restart and initialize Thermal Control $\backslash$ APID 0x645 $\backslash$ function code 1 )}{\pageref{struct__LTC__ReStart__Prm}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__rl}{\_\-LTC\_\-rl} (Response list to read PDU environment registers )}{\pageref{struct__LTC__rl}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__SetMode__Pkt}{\_\-LTC\_\-Set\-Mode\_\-Pkt} (Set thermal control mode to active or passive. $\backslash$ APID 0x645 $\backslash$ function code 4 )}{\pageref{struct__LTC__SetMode__Pkt}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__SetMode__Prm}{\_\-LTC\_\-Set\-Mode\_\-Prm} (Set thermal control mode to active or passive. $\backslash$ APID 0x645 $\backslash$ function code 4 )}{\pageref{struct__LTC__SetMode__Prm}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__SetParam__Pkt}{\_\-LTC\_\-Set\-Param\_\-Pkt} (Set control parameters to new values. $\backslash$ APID 0x645 $\backslash$ function code 6 )}{\pageref{struct__LTC__SetParam__Pkt}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__SetParam__Prm}{\_\-LTC\_\-Set\-Param\_\-Prm} (Set control parameters to new values. $\backslash$ APID 0x645 $\backslash$ function code 6 )}{\pageref{struct__LTC__SetParam__Prm}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__SetTlmFreq__Pkt}{\_\-LTC\_\-Set\-Tlm\-Freq\_\-Pkt} (Set LTC telemetry frequency, 0 is off. $\backslash$ APID 0x645 $\backslash$ function code 7 )}{\pageref{struct__LTC__SetTlmFreq__Pkt}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__SetTlmFreq__Prm}{\_\-LTC\_\-Set\-Tlm\-Freq\_\-Prm} (Set LTC telemetry frequency, 0 is off. $\backslash$ APID 0x645 $\backslash$ function code 7 )}{\pageref{struct__LTC__SetTlmFreq__Prm}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__Start__Pkt}{\_\-LTC\_\-Start\_\-Pkt} (Start control $\backslash$ APID 0x645 $\backslash$ function code 2 )}{\pageref{struct__LTC__Start__Pkt}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__Start__Prm}{\_\-LTC\_\-Start\_\-Prm} (Start control $\backslash$ APID 0x645 $\backslash$ function code 2 )}{\pageref{struct__LTC__Start__Prm}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__Stop__Pkt}{\_\-LTC\_\-Stop\_\-Pkt} (Terminate Thermal Control processing $\backslash$ APID 0x645 $\backslash$ function code 3 )}{\pageref{struct__LTC__Stop__Pkt}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__Wrk}{\_\-LTC\_\-Wrk} (LTC working storage )}{\pageref{struct__LTC__Wrk}}{}
\item\contentsline{section}{\hyperlink{structLTC__BinFileHeader}{LTC\_\-Bin\-File\-Header} (Binary file header for LTC input files )}{\pageref{structLTC__BinFileHeader}}{}
\item\contentsline{section}{\hyperlink{unionLTC__Cmds}{LTC\_\-Cmds} (Packets for providing telecommands to periodic processing )}{\pageref{unionLTC__Cmds}}{}
\item\contentsline{section}{\hyperlink{structLTC__Cntrl}{LTC\_\-Cntrl} (Control algorithm heater \char`\"{}on/off\char`\"{} and history bit masks )}{\pageref{structLTC__Cntrl}}{}
\item\contentsline{section}{\hyperlink{structLTC__CntrlParams}{LTC\_\-Cntrl\-Params} (Control algogrithm parameters for a heat pipe )}{\pageref{structLTC__CntrlParams}}{}
\item\contentsline{section}{\hyperlink{structLTC__CnvRec}{LTC\_\-Cnv\-Rec} (Record for count to temperature conversion table )}{\pageref{structLTC__CnvRec}}{}
\item\contentsline{section}{\hyperlink{structLTC__CnvTbl}{LTC\_\-Cnv\-Tbl} (Count to temperature conversion table )}{\pageref{structLTC__CnvTbl}}{}
\item\contentsline{section}{\hyperlink{structLTC__CommonParams}{LTC\_\-Common\-Params} (LTC common configuration parameters )}{\pageref{structLTC__CommonParams}}{}
\item\contentsline{section}{\hyperlink{structLTC__Converter}{LTC\_\-Converter} (Data for converting from adc counts to temperature )}{\pageref{structLTC__Converter}}{}
\item\contentsline{section}{\hyperlink{structLTC__FileDef}{LTC\_\-File\-Def} (Definition record for file )}{\pageref{structLTC__FileDef}}{}
\item\contentsline{section}{\hyperlink{structLTC__Filter}{LTC\_\-Filter} (Data for smoothing filter )}{\pageref{structLTC__Filter}}{}
\item\contentsline{section}{\hyperlink{structLTC__FltDf}{LTC\_\-Flt\-Df} (Data defining temperature smoothing filter )}{\pageref{structLTC__FltDf}}{}
\item\contentsline{section}{\hyperlink{structLTC__HeatPipe}{LTC\_\-Heat\-Pipe} (All data associated with a heat pipe (VCHP) )}{\pageref{structLTC__HeatPipe}}{}
\item\contentsline{section}{\hyperlink{structLTC__HpConfigFile}{LTC\_\-Hp\-Config\-File} (Storage for heat pipe configuration data read from file )}{\pageref{structLTC__HpConfigFile}}{}
\item\contentsline{section}{\hyperlink{structLTC__HpConfigRec}{LTC\_\-Hp\-Config\-Rec} (Configuration data for a single heat pipe )}{\pageref{structLTC__HpConfigRec}}{}
\item\contentsline{section}{\hyperlink{structLTC__LcbRspBlk}{LTC\_\-Lcb\-Rsp\-Blk} (Data for processing response from LCB for PDU reads of sensors )}{\pageref{structLTC__LcbRspBlk}}{}
\item\contentsline{section}{\hyperlink{structLTC__Options}{LTC\_\-Options} (HP processing options, sensor and sel bits )}{\pageref{structLTC__Options}}{}
\item\contentsline{section}{\hyperlink{structLTC__PduMeasRec}{LTC\_\-Pdu\-Meas\-Rec} (Info for needed to acquire measurement from PDU group )}{\pageref{structLTC__PduMeasRec}}{}
\item\contentsline{section}{\hyperlink{structLTC__PduTbl}{LTC\_\-Pdu\-Tbl} (Info for inputting sensor measurements from PDU )}{\pageref{structLTC__PduTbl}}{}
\item\contentsline{section}{\hyperlink{structLTC__Sensor}{LTC\_\-Sensor} (Temperature sensor counts read per cycle )}{\pageref{structLTC__Sensor}}{}
\item\contentsline{section}{\hyperlink{unionLTC__SnsrDef}{LTC\_\-Snsr\-Def} (Sensor definition (connected heat pipe and sensor type) )}{\pageref{unionLTC__SnsrDef}}{}
\item\contentsline{section}{\hyperlink{structLTC__SnsrDef_1_1LTC__SnsrDef__BitField}{LTC\_\-Snsr\-Def::LTC\_\-Snsr\-Def\_\-Bit\-Field} (Sensor definition bit field. )}{\pageref{structLTC__SnsrDef_1_1LTC__SnsrDef__BitField}}{}
\item\contentsline{section}{\hyperlink{structLTC__SnsrFile}{LTC\_\-Snsr\-File} (Storage for heat pipe configuration data read from file )}{\pageref{structLTC__SnsrFile}}{}
\item\contentsline{section}{\hyperlink{structLTC__Temperature}{LTC\_\-Temperature} (Heat pipe (VCHP) temperatures )}{\pageref{structLTC__Temperature}}{}
\end{CompactList}
