\section{Data Structures}
Here are the data structures with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{struct__LTC__cl}{\_\-LTC\_\-cl} (Command list to read PDU env register )}{\pageref{struct__LTC__cl}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__DiagLTC__Tlm}{\_\-LTC\_\-Diag\-LTC\_\-Tlm} (LAT Thermal Control diagnostic telemetry $\backslash$ APID 0x2da )}{\pageref{struct__LTC__DiagLTC__Tlm}}{}
\item\contentsline{section}{\hyperlink{union__LTC__ResRitSnsrSel}{\_\-LTC\_\-Res\-Rit\-Snsr\-Sel} (Union for telemetry bitfield \hyperlink{struct__LTC__ResRitSnsrSel__Bfl}{\_\-LTC\_\-Res\-Rit\-Snsr\-Sel\_\-Bfl} )}{\pageref{union__LTC__ResRitSnsrSel}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__ResRitSnsrSel__Bfl}{\_\-LTC\_\-Res\-Rit\-Snsr\-Sel\_\-Bfl} (Selected RSVR and RIT sensors )}{\pageref{struct__LTC__ResRitSnsrSel__Bfl}}{}
\item\contentsline{section}{\hyperlink{union__LTC__ResRitStatus}{\_\-LTC\_\-Res\-Rit\-Status} (Union for telemetry bitfield \hyperlink{struct__LTC__ResRitStatus__Bfl}{\_\-LTC\_\-Res\-Rit\-Status\_\-Bfl} )}{\pageref{union__LTC__ResRitStatus}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__ResRitStatus__Bfl}{\_\-LTC\_\-Res\-Rit\-Status\_\-Bfl} (Heat pipe RIT and reservoir sensors status )}{\pageref{struct__LTC__ResRitStatus__Bfl}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__rl}{\_\-LTC\_\-rl} (Response list to read PDU environment registers )}{\pageref{struct__LTC__rl}}{}
\item\contentsline{section}{\hyperlink{struct__LTC__Wrk}{\_\-LTC\_\-Wrk} (LTC working storage )}{\pageref{struct__LTC__Wrk}}{}
\item\contentsline{section}{\hyperlink{structLTC__BinFileHeader}{LTC\_\-Bin\-File\-Header} (Binary file header for LTC input files )}{\pageref{structLTC__BinFileHeader}}{}
\item\contentsline{section}{\hyperlink{structLTC__Cntrl}{LTC\_\-Cntrl} (Control algorithm heater \char`\"{}on/off\char`\"{} and history bit masks )}{\pageref{structLTC__Cntrl}}{}
\item\contentsline{section}{\hyperlink{structLTC__CntrlParams}{LTC\_\-Cntrl\-Params} (Control algogrithm parameters for a heat pipe )}{\pageref{structLTC__CntrlParams}}{}
\item\contentsline{section}{\hyperlink{structLTC__CnvRec}{LTC\_\-Cnv\-Rec} (Record for count to temperature conversion table )}{\pageref{structLTC__CnvRec}}{}
\item\contentsline{section}{\hyperlink{structLTC__CnvTbl}{LTC\_\-Cnv\-Tbl} (Count to temperature conversion table )}{\pageref{structLTC__CnvTbl}}{}
\item\contentsline{section}{\hyperlink{structLTC__CommonParams}{LTC\_\-Common\-Params} (LTC common configuration parameters )}{\pageref{structLTC__CommonParams}}{}
\item\contentsline{section}{\hyperlink{structLTC__Converter}{LTC\_\-Converter} (Data for converting from adc counts to temperature )}{\pageref{structLTC__Converter}}{}
\item\contentsline{section}{\hyperlink{structLTC__FileDef}{LTC\_\-File\-Def} (Definition record for file )}{\pageref{structLTC__FileDef}}{}
\item\contentsline{section}{\hyperlink{structLTC__Filter}{LTC\_\-Filter} (Data for smoothing filter )}{\pageref{structLTC__Filter}}{}
\item\contentsline{section}{\hyperlink{structLTC__FltDf}{LTC\_\-Flt\-Df} (Data defining temperature smoothing filter )}{\pageref{structLTC__FltDf}}{}
\item\contentsline{section}{\hyperlink{structLTC__HeatPipe}{LTC\_\-Heat\-Pipe} (All data associated with a heat pipe (VCHP) )}{\pageref{structLTC__HeatPipe}}{}
\item\contentsline{section}{\hyperlink{structLTC__HpConfigFile}{LTC\_\-Hp\-Config\-File} (Storage for heat pipe configuration data read from file )}{\pageref{structLTC__HpConfigFile}}{}
\item\contentsline{section}{\hyperlink{structLTC__HpConfigRec}{LTC\_\-Hp\-Config\-Rec} (Configuration data for a single heat pipe )}{\pageref{structLTC__HpConfigRec}}{}
\item\contentsline{section}{\hyperlink{structLTC__Options}{LTC\_\-Options} (HP processing options, sensor and sel bits )}{\pageref{structLTC__Options}}{}
\item\contentsline{section}{\hyperlink{structLTC__Sensor}{LTC\_\-Sensor} (Temperature sensor counts read per cycle )}{\pageref{structLTC__Sensor}}{}
\item\contentsline{section}{\hyperlink{unionLTC__SnsrDef}{LTC\_\-Snsr\-Def} (Sensor definition (connected heat pipe and sensor type) )}{\pageref{unionLTC__SnsrDef}}{}
\item\contentsline{section}{\hyperlink{structLTC__SnsrDef_1_1LTC__SnsrDef__BitField}{LTC\_\-Snsr\-Def::LTC\_\-Snsr\-Def\_\-Bit\-Field} (Sensor definition bit field. )}{\pageref{structLTC__SnsrDef_1_1LTC__SnsrDef__BitField}}{}
\item\contentsline{section}{\hyperlink{structLTC__Temperature}{LTC\_\-Temperature} (Heat pipe (VCHP) temperatures )}{\pageref{structLTC__Temperature}}{}
\end{CompactList}
