\hypertarget{unionLTC__SnsrDef}{
\section{LTC\_\-SnsrDef Union Reference}
\label{unionLTC__SnsrDef}\index{LTC_SnsrDef@{LTC\_\-SnsrDef}}
}
Sensor definition (connected heat pipe and sensor type).  


{\tt \#include $<$ltcPrivate.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
struct \hyperlink{structLTC__SnsrDef_1_1LTC__SnsrDef__BitField}{LTC\_\-SnsrDef::LTC\_\-SnsrDef\_\-BitField} \hyperlink{unionLTC__SnsrDef_eadc7046deb3055827183d010b45acb9}{bf}
\item 
unsigned char \hyperlink{unionLTC__SnsrDef_6f0f07b6946db292228ccbc0695fb43b}{df}
\end{CompactItemize}
\subsection*{Classes}
\begin{CompactItemize}
\item 
struct \hyperlink{structLTC__SnsrDef_1_1LTC__SnsrDef__BitField}{LTC\_\-SnsrDef\_\-BitField}
\begin{CompactList}\small\item\em Sensor definition bit field.. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Sensor definition (connected heat pipe and sensor type). 

\subsection{Member Data Documentation}
\hypertarget{unionLTC__SnsrDef_eadc7046deb3055827183d010b45acb9}{
\index{LTC_SnsrDef@{LTC\_\-SnsrDef}!bf@{bf}}
\index{bf@{bf}!LTC_SnsrDef@{LTC\_\-SnsrDef}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}struct {\bf LTC\_\-SnsrDef::LTC\_\-SnsrDef\_\-BitField}  {\bf LTC\_\-SnsrDef::bf}}}
\label{unionLTC__SnsrDef_eadc7046deb3055827183d010b45acb9}


Bit fields \hypertarget{unionLTC__SnsrDef_6f0f07b6946db292228ccbc0695fb43b}{
\index{LTC_SnsrDef@{LTC\_\-SnsrDef}!df@{df}}
\index{df@{df}!LTC_SnsrDef@{LTC\_\-SnsrDef}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}unsigned char {\bf LTC\_\-SnsrDef::df}}}
\label{unionLTC__SnsrDef_6f0f07b6946db292228ccbc0695fb43b}


Access all bit fields 

The documentation for this union was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{ltcPrivate_8h}{ltcPrivate.h}\end{CompactItemize}
