\hypertarget{unionLTC__SnsrDef}{
\section{LTC\_\-Snsr\-Def Union Reference}
\label{unionLTC__SnsrDef}\index{LTC_SnsrDef@{LTC\_\-SnsrDef}}
}
Sensor definition (connected heat pipe and sensor type).  


{\tt \#include $<$ltc\-Private.h$>$}

Collaboration diagram for LTC\_\-Snsr\-Def:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=117pt]{unionLTC__SnsrDef__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hyperlink{structLTC__SnsrDef_1_1LTC__SnsrDef__BitField}{LTC\_\-Snsr\-Def::LTC\_\-Snsr\-Def\_\-Bit\-Field} \hyperlink{unionLTC__SnsrDef_o0}{bf}
\item 
unsigned char \hyperlink{unionLTC__SnsrDef_o1}{df}
\end{CompactItemize}
\subsection*{Data Structures}
\begin{CompactItemize}
\item 
struct \hyperlink{structLTC__SnsrDef_1_1LTC__SnsrDef__BitField}{LTC\_\-Snsr\-Def\_\-Bit\-Field}
\begin{CompactList}\small\item\em Sensor definition bit field.. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Sensor definition (connected heat pipe and sensor type). 



\subsection{Field Documentation}
\hypertarget{unionLTC__SnsrDef_o0}{
\index{LTC_SnsrDef@{LTC\_\-Snsr\-Def}!bf@{bf}}
\index{bf@{bf}!LTC_SnsrDef@{LTC\_\-Snsr\-Def}}
\subsubsection[bf]{\setlength{\rightskip}{0pt plus 5cm}struct \hyperlink{structLTC__SnsrDef_1_1LTC__SnsrDef__BitField}{LTC\_\-Snsr\-Def::LTC\_\-Snsr\-Def\_\-Bit\-Field}  \hyperlink{unionLTC__SnsrDef_o0}{LTC\_\-Snsr\-Def::bf}}}
\label{unionLTC__SnsrDef_o0}


Bit fields \hypertarget{unionLTC__SnsrDef_o1}{
\index{LTC_SnsrDef@{LTC\_\-Snsr\-Def}!df@{df}}
\index{df@{df}!LTC_SnsrDef@{LTC\_\-Snsr\-Def}}
\subsubsection[df]{\setlength{\rightskip}{0pt plus 5cm}unsigned char \hyperlink{unionLTC__SnsrDef_o1}{LTC\_\-Snsr\-Def::df}}}
\label{unionLTC__SnsrDef_o1}


Access all bit fields 

The documentation for this union was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{ltcPrivate_8h}{ltc\-Private.h}\end{CompactItemize}
