\hypertarget{structLTC__Temperature}{
\section{LTC\_\-Temperature Struct Reference}
\label{structLTC__Temperature}\index{LTC_Temperature@{LTC\_\-Temperature}}
}
Heat pipe (VCHP) temperatures.  


{\tt \#include $<$ltc\-Private.h$>$}

Collaboration diagram for LTC\_\-Temperature:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=189pt]{structLTC__Temperature__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hyperlink{structLTC__TempConvertFile}{LTC\_\-Temp\-Convert\-File} $\ast$ \hyperlink{structLTC__Temperature_o0}{cnv\-F}
\item 
signed short $\ast$ \hyperlink{structLTC__Temperature_o1}{cnv}
\item 
signed short \hyperlink{structLTC__Temperature_o2}{nt}
\item 
signed short \hyperlink{structLTC__Temperature_o3}{celsius}
\item 
signed short \hyperlink{structLTC__Temperature_o4}{est}
\item 
signed short \hyperlink{structLTC__Temperature_o5}{est\-Tol}
\item 
\hyperlink{structLTC__FilterDefFile}{LTC\_\-Filter\-Def\-File} $\ast$ \hyperlink{structLTC__Temperature_o6}{flt\-F}
\item 
\hyperlink{structLTC__Filter}{LTC\_\-Filter} \hyperlink{structLTC__Temperature_o7}{flt}
\end{CompactItemize}


\subsection{Detailed Description}
Heat pipe (VCHP) temperatures. 



\subsection{Field Documentation}
\hypertarget{structLTC__Temperature_o3}{
\index{LTC_Temperature@{LTC\_\-Temperature}!celsius@{celsius}}
\index{celsius@{celsius}!LTC_Temperature@{LTC\_\-Temperature}}
\subsubsection[celsius]{\setlength{\rightskip}{0pt plus 5cm}signed short \hyperlink{structLTC__Temperature_o3}{LTC\_\-Temperature::celsius}}}
\label{structLTC__Temperature_o3}


temperature value in celsius \hypertarget{structLTC__Temperature_o1}{
\index{LTC_Temperature@{LTC\_\-Temperature}!cnv@{cnv}}
\index{cnv@{cnv}!LTC_Temperature@{LTC\_\-Temperature}}
\subsubsection[cnv]{\setlength{\rightskip}{0pt plus 5cm}signed short$\ast$ \hyperlink{structLTC__Temperature_o1}{LTC\_\-Temperature::cnv}}}
\label{structLTC__Temperature_o1}


Info convert from adc value to temp \hypertarget{structLTC__Temperature_o0}{
\index{LTC_Temperature@{LTC\_\-Temperature}!cnvF@{cnvF}}
\index{cnvF@{cnvF}!LTC_Temperature@{LTC\_\-Temperature}}
\subsubsection[cnvF]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{structLTC__TempConvertFile}{LTC\_\-Temp\-Convert\-File}$\ast$ \hyperlink{structLTC__Temperature_o0}{LTC\_\-Temperature::cnv\-F}}}
\label{structLTC__Temperature_o0}


Storage for temp conversion \hypertarget{structLTC__Temperature_o4}{
\index{LTC_Temperature@{LTC\_\-Temperature}!est@{est}}
\index{est@{est}!LTC_Temperature@{LTC\_\-Temperature}}
\subsubsection[est]{\setlength{\rightskip}{0pt plus 5cm}signed short \hyperlink{structLTC__Temperature_o4}{LTC\_\-Temperature::est}}}
\label{structLTC__Temperature_o4}


estimated value for next cycle \hypertarget{structLTC__Temperature_o5}{
\index{LTC_Temperature@{LTC\_\-Temperature}!estTol@{estTol}}
\index{estTol@{estTol}!LTC_Temperature@{LTC\_\-Temperature}}
\subsubsection[estTol]{\setlength{\rightskip}{0pt plus 5cm}signed short \hyperlink{structLTC__Temperature_o5}{LTC\_\-Temperature::est\-Tol}}}
\label{structLTC__Temperature_o5}


tolerance on temperature estimate \hypertarget{structLTC__Temperature_o7}{
\index{LTC_Temperature@{LTC\_\-Temperature}!flt@{flt}}
\index{flt@{flt}!LTC_Temperature@{LTC\_\-Temperature}}
\subsubsection[flt]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{structLTC__Filter}{LTC\_\-Filter} \hyperlink{structLTC__Temperature_o7}{LTC\_\-Temperature::flt}}}
\label{structLTC__Temperature_o7}


Smoothing filter \hypertarget{structLTC__Temperature_o6}{
\index{LTC_Temperature@{LTC\_\-Temperature}!fltF@{fltF}}
\index{fltF@{fltF}!LTC_Temperature@{LTC\_\-Temperature}}
\subsubsection[fltF]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{structLTC__FilterDefFile}{LTC\_\-Filter\-Def\-File}$\ast$ \hyperlink{structLTC__Temperature_o6}{LTC\_\-Temperature::flt\-F}}}
\label{structLTC__Temperature_o6}


Smoothing filter storage \hypertarget{structLTC__Temperature_o2}{
\index{LTC_Temperature@{LTC\_\-Temperature}!nt@{nt}}
\index{nt@{nt}!LTC_Temperature@{LTC\_\-Temperature}}
\subsubsection[nt]{\setlength{\rightskip}{0pt plus 5cm}signed short \hyperlink{structLTC__Temperature_o2}{LTC\_\-Temperature::nt}}}
\label{structLTC__Temperature_o2}


VCHP number temps calculated, 0 - 2 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{ltcPrivate_8h}{ltc\-Private.h}\end{CompactItemize}
