\hypertarget{structLTC__FltDf}{
\section{LTC\_\-Flt\-Df Struct Reference}
\label{structLTC__FltDf}\index{LTC_FltDf@{LTC\_\-FltDf}}
}
Data defining temperature smoothing filter.  


{\tt \#include $<$ltc\-Private.h$>$}

\subsection*{Data Fields}
\begin{CompactItemize}
\item 
int \hyperlink{structLTC__FltDf_o0}{fln}
\item 
signed int \hyperlink{structLTC__FltDf_o1}{cf} \mbox{[}LTC\_\-MAX\_\-FLT\_\-SZ\mbox{]}
\end{CompactItemize}


\subsection{Detailed Description}
Data defining temperature smoothing filter. 



\subsection{Field Documentation}
\hypertarget{structLTC__FltDf_o1}{
\index{LTC_FltDf@{LTC\_\-Flt\-Df}!cf@{cf}}
\index{cf@{cf}!LTC_FltDf@{LTC\_\-Flt\-Df}}
\subsubsection[cf]{\setlength{\rightskip}{0pt plus 5cm}signed int \hyperlink{structLTC__FltDf_o1}{LTC\_\-Flt\-Df::cf}\mbox{[}LTC\_\-MAX\_\-FLT\_\-SZ\mbox{]}}}
\label{structLTC__FltDf_o1}


coeff array (variable size) \hypertarget{structLTC__FltDf_o0}{
\index{LTC_FltDf@{LTC\_\-Flt\-Df}!fln@{fln}}
\index{fln@{fln}!LTC_FltDf@{LTC\_\-Flt\-Df}}
\subsubsection[fln]{\setlength{\rightskip}{0pt plus 5cm}int \hyperlink{structLTC__FltDf_o0}{LTC\_\-Flt\-Df::fln}}}
\label{structLTC__FltDf_o0}


length in terms of back values 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{ltcPrivate_8h}{ltc\-Private.h}\end{CompactItemize}
