\hypertarget{structLTC__HpConfigFile}{
\section{LTC\_\-Hp\-Config\-File Struct Reference}
\label{structLTC__HpConfigFile}\index{LTC_HpConfigFile@{LTC\_\-HpConfigFile}}
}
Storage for heat pipe configuration data read from file.  


{\tt \#include $<$ltc\-Private.h$>$}

Collaboration diagram for LTC\_\-Hp\-Config\-File:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=136pt]{structLTC__HpConfigFile__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hyperlink{structLTC__BinFileHeader}{LTC\_\-Bin\-File\-Header} \hyperlink{structLTC__HpConfigFile_o0}{bin\-Hdr}
\item 
\hyperlink{ltcPrivate_8h_a24}{LTC\_\-Common\-Params} \hyperlink{structLTC__HpConfigFile_o1}{common}
\item 
\hyperlink{structLTC__HpConfigRec}{LTC\_\-Hp\-Config\-Rec} \hyperlink{structLTC__HpConfigFile_o2}{cnfg} \mbox{[}LTC\_\-NUM\_\-HPs\mbox{]}
\end{CompactItemize}


\subsection{Detailed Description}
Storage for heat pipe configuration data read from file. 



\subsection{Field Documentation}
\hypertarget{structLTC__HpConfigFile_o0}{
\index{LTC_HpConfigFile@{LTC\_\-Hp\-Config\-File}!binHdr@{binHdr}}
\index{binHdr@{binHdr}!LTC_HpConfigFile@{LTC\_\-Hp\-Config\-File}}
\subsubsection[binHdr]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{structLTC__BinFileHeader}{LTC\_\-Bin\-File\-Header} \hyperlink{structLTC__HpConfigFile_o0}{LTC\_\-Hp\-Config\-File::bin\-Hdr}}}
\label{structLTC__HpConfigFile_o0}


LTC Header for files \hypertarget{structLTC__HpConfigFile_o2}{
\index{LTC_HpConfigFile@{LTC\_\-Hp\-Config\-File}!cnfg@{cnfg}}
\index{cnfg@{cnfg}!LTC_HpConfigFile@{LTC\_\-Hp\-Config\-File}}
\subsubsection[cnfg]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{structLTC__HpConfigRec}{LTC\_\-Hp\-Config\-Rec} \hyperlink{structLTC__HpConfigFile_o2}{LTC\_\-Hp\-Config\-File::cnfg}\mbox{[}LTC\_\-NUM\_\-HPs\mbox{]}}}
\label{structLTC__HpConfigFile_o2}


HP configuration record \hypertarget{structLTC__HpConfigFile_o1}{
\index{LTC_HpConfigFile@{LTC\_\-Hp\-Config\-File}!common@{common}}
\index{common@{common}!LTC_HpConfigFile@{LTC\_\-Hp\-Config\-File}}
\subsubsection[common]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{ltcPrivate_8h_a24}{LTC\_\-Common\-Params} \hyperlink{structLTC__HpConfigFile_o1}{LTC\_\-Hp\-Config\-File::common}}}
\label{structLTC__HpConfigFile_o1}


LTC Common parameters 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{ltcPrivate_8h}{ltc\-Private.h}\end{CompactItemize}
